dialyzer

v6.0

Dialyzer Release Notes

This document describes the changes made to the Dialyzer application.

Dialyzer 6.0

Improvements and New Features

Native records as described in EEP-79 has been implemented.

A native record is a data structure similar to the traditional tuple-based records, except that is a true data type.

Native records are considered experimental in Erlang/OTP 29 and possibly also in Erlang/OTP 30, meaning that their behavior may change, potentially requiring updates to applications that use them.

Own Id: OTP-19785 Aux Id: PR-10617

The guard BIF is_integer/3 has been added. It follows the design of the original EEP-16, only changing the name from is_between to is_integer. This BIF takes in 3 parameters, Term, LowerBound, and UpperBound.

It returns true if Term, LowerBound, and UpperBound are all integers, and LowerBound =< Term =< UpperBound; otherwise, it returns false.

Example:

1> I = 42.
2> is_integer(I, 0, 100).
true

Own Id: OTP-19809 Aux Id: PR-10276

Added support for -unsafe attributes, which is used to mark functions as unsafe to use.

This is similar to but separate from deprecation, and the compiler will by default now generate warnings for calls to functions in Erlang/OTP that are known to be always unsafe.

Furthermore, xref can now be used to find calls to functions in another application that lack a -doc attribute (undocumented_function_calls), calls to functions in another application marked -doc false. (private_function_calls), as well as calls to unsafe functions (unsafe_function_calls).

Own Id: OTP-20066 Aux Id: PR-10839

Dialyzer 5.4

Fixed Bugs and Malfunctions

The -Wno_unknown option will now prevent a warning being printed to standard output when the command line interface is used.

Own Id: OTP-19262 Aux Id: GH-8822, PR-8885

Improvements and New Features

EEP-69: Nominal Types has been implemented. As a side effect, nominal types can encode opaque types. We changed all opaque-handling logic and improved opaque warnings in Dialyzer.

All existing Erlang type systems are structural: two types are seen as equivalent if their structures are the same. Type comparisons are based on the structures of the types, not on how the user explicitly defines them. For example, in the following example, meter() and foot() are equivalent. The two types can be used interchangeably. Neither of them differ from the basic type integer().

-type meter() :: integer().
-type foot() :: integer().

Nominal typing is an alternative type system, where two types are equivalent if and only if they are declared with the same type name. The EEP proposes one new syntax -nominal for declaring nominal types. Under nominal typing, meter() and foot() are no longer compatible. Whenever a function expects type meter(), passing in type foot() would result in a Dialyzer error.

-nominal meter() :: integer().
-nominal foot() :: integer().

More nominal type-checking rules can be found in the EEP. It is worth noting that most work for adding nominal types and type-checking is in erl_types.erl. The rest are changes that removed the previous opaque type-checking, and added an improved version of it using nominal type-checking with reworked warnings.

Backwards compatibility for opaque type-checking is not preserved by this PR. Previous opaque warnings can appear with slightly different wordings. A new kind of opaque warning opaque_union is added, together with a Dialyzer option no_opaque_union to turn this kind of warnings off.

Own Id: OTP-19364 Aux Id: PR-9079

Fixed licenses in files and added ORT curations to the following apps: otp, eldap, erl_interface, eunit, parsetools, stdlib, syntax_tools, and ERTS.

Own Id: OTP-19478 Aux Id: PR-9376, PR-9402, PR-9819

The license and copyright header has changed format to include an SPDX-License-Identifier. At the same time, most files have been updated to follow a uniform standard for license headers.

Own Id: OTP-19575 Aux Id: PR-9670

Dialyzer 5.3.1

Fixed Bugs and Malfunctions

Fixed a crash caused by the use of opaque types.

Own Id: OTP-19439 Aux Id: ERIERL-1183, PR-9314

Dialyzer 5.3

Fixed Bugs and Malfunctions

Fixed type inference for erlang:system_info(logical_processors).

Own Id: OTP-19307 Aux Id: PR-8954, GH-8948

Dialyzer would crash when attempting to analyze a module compiled with the line_coverage option.

Own Id: OTP-19344 Aux Id: GH-9027, PR-9034

Improvements and New Features

Erlang/OTP type specifications has been updated to eliminate overlapping domains.

Own Id: OTP-19310 Aux Id: GH-8810, GH-8821, PR-8986

Dialyzer 5.2.1

Fixed Bugs and Malfunctions

Man pages are now available for erl, erlc, dialyzer, and all other programs that are included in Erlang/OTP.

Own Id: OTP-19201 Aux Id: PR-8740

Dialyzer 5.2

Improvements and New Features

The --gui option for Dialyzer has been removed.

Own Id: OTP-18667 Aux Id: PR-7443

The documentation has been migrated to use Markdown and ExDoc.

Own Id: OTP-18955 Aux Id: PR-8026

Dialyzer 5.1.3.1

Fixed Bugs and Malfunctions

Fixed a crash caused by the use of opaque types.

Own Id: OTP-19439 Aux Id: ERIERL-1183, PR-9314

Dialyzer 5.1.3

Fixed Bugs and Malfunctions

Fixed an issue with bitstring type inference on segments following UTF-8/16/32 segments.

Own Id: OTP-19068 Aux Id: GH-8383

Dialyzer 5.1.2

Fixed Bugs and Malfunctions

Fix dialyzer --output flag to work. This option was accidentally removed in OTP 26.0.

Own Id: OTP-18767 Aux Id: PR-7657

Fixed a crash in contract checking relating to opaque types.

Own Id: OTP-18772 Aux Id: GH-7676

Dialyzer 5.1.1

Fixed Bugs and Malfunctions

Fixed a bug that caused dialyzer to crash when analyzing bogus code that contained the literal atom undefined in segment sizes.

Own Id: OTP-18629 Aux Id: GH-7325

Dialyzer could crash when attempting to analyze a module that defined a type called product/.

Own Id: OTP-18738 Aux Id: GH-7584

Dialyzer 5.1

Fixed Bugs and Malfunctions

When checking behaviors, Dialyzer could generate false warning that a callback function did not have the correct type according to the spec in the behavior definition.

Own Id: OTP-18237 Aux Id: GH-6221, PR-6243

In a spec, list(none()) used to mean none/0. It has now been corrected to mean the empty list.

Own Id: OTP-18276 Aux Id: GH-6333

The compiler would silently accept singleton (unbound) type variables in a union type. Starting from Erlang/OTP 26, the compiler will generate a warning for this example. The warning can be disabled using the nowarn_singleton_typevar option. In Erlang/OTP 27, the warning will become an error.

Own Id: OTP-18389 Aux Id: GH-6508, PR-6864, GH-7116

Fixed a bug that prevented the --plts option from being used together with --add-to-plt.

Own Id: OTP-18485 Aux Id: GH-6850, PR-6854

Fixed a crash when analyzing code that contained illegal bitstring segment sizes.

Own Id: OTP-18562

Fixed a crash when formatting certain warnings that contained multi-byte unicode characters.

Own Id: OTP-18564 Aux Id: GH-7153

Improvements and New Features

Dialyzer has a new incremental mode that be invoked by giving the --incremental option when running Dialyzer. This new incremental mode is likely to become the default in a future release.

Incremental mode primarily differs from the previous, "classic", ways of running Dialyzer, in that its model is optimised around the common use case of regularly analysing a single codebase, tweaking the code, analysing it again, and so on, without explicit reference to the building and checking of a PLT.

In this mode the PLT file acts much more like a true cache, where users provide a codebase and a set of files they care about, and Dialyzer does the legwork in terms of deciding how to most efficiently report all of the relevant warnings given the cached results it may already have in the PLT (and if a PLT doesn't exist, incremental mode will create one).

Own Id: OTP-18188 Aux Id: PR-5997

Dialyzer now produces clearer error messages for contract violations.

Own Id: OTP-18238 Aux Id: PR-6271

The name of a built-in type can now be reused as the name of type locally. That is useful when an OTP release introduces a new built-in type; having the possibility to redefine built-in types locally can make it easier to maintain code that works in multiple OTP releases.

Own Id: OTP-18282 Aux Id: GH-6132, PR-6335

There is new option -no_spec to ignore all specs. It is useful for debugging when one suspects that some specs could be incorrect.

Own Id: OTP-18310

Dialyzer's overloaded domain warning is now disabled by default, and can be enabled with the flag -Woverlapping_contract.

Dialyzer used to issue a warning for overloaded domains stating "such contracts are currently unsupported and are simply ignored".

These contracts are not "ignored" but rather, Dialyzer takes the union of the overloaded domains. This means that we lose the dependency from each corresponding input to output type. Because of this, the warning is really about not being able to establish a dependency between the input and output types of each respective overloaded function specification.

Own Id: OTP-18342 Aux Id: GH-6117, PR-6654

Dialyzer has enabled (by default) warnings about unknown types and functions.

Prior to this change, Dialyzer had warnings about unknown types and functions disabled (by default).

This default value has been overwritten; Dialyzer now warns about unknown types and functions (as requested by the community in GH-5695). Thus, the following two examples are equivalent, i.e., passing the -Wunknown function is enabled by default:

dialyzer moduler.erl -Wunknown -Wmissing_return

dialyzer moduler.erl -Wmissing_return

Dialyzer has a new flag, -Wno_unknown. Its purpose is to suppress warnings about unknown functions and types.

Users who wish to suppress these warnings can invoke Dialyzer using this flag. Example: dialyzer module.erl -Wno_unknown

* POTENTIAL INCOMPATIBILITY *

Own Id: OTP-18439 Aux Id: GH-5695,PR-6822, GH-6942

Deprecates dbg:stop_clear/0 because it is simply a function alias to dbg:stop/0

Own Id: OTP-18478 Aux Id: GH-6903

Added the new built-in type dynamic/0 introduced in EEP-61, improving support for gradual type checkers.

Own Id: OTP-18522

Added the argparse module for simplified argument handling in escripts and similar.

Own Id: OTP-18558 Aux Id: PR-6852

Dialyzer 5.0.5

Fixed Bugs and Malfunctions

Fixed a bug that would cause analysis to crash.

Own Id: OTP-18372 Aux Id: GH-6580

Improvements and New Features

Replace size/1 with either tuple_size/1 or byte_size/1

The size/1 BIF is not optimized by the JIT, and its use can result in worse types for Dialyzer.

When one knows that the value being tested must be a tuple, tuple_size/1 should always be preferred.

When one knows that the value being tested must be a binary, byte_size/1 should be preferred. However, byte_size/1 also accepts a bitstring (rounding up size to a whole number of bytes), so one must make sure that the call to byte_size/ is preceded by a call to is_binary/1 to ensure that bitstrings are rejected. Note that the compiler removes redundant calls to is_binary/1, so if one is not sure whether previous code had made sure that the argument is a binary, it does not harm to add an is_binary/1 test immediately before the call to byte_size/1.

Own Id: OTP-18432 Aux Id: GH-6672,PR-6793,PR-6784,PR-6787,PR-6785,PR-6682,PR-6800,PR-6797,PR-6798,PR-6799,PR-6796,PR-6813,PR-6671,PR-6673,PR-6684,PR-6694,GH-6677,PR-6696,PR-6670,PR-6674

Dialyzer 5.0.4

Fixed Bugs and Malfunctions

Dialyzer would crash when attempting to analyze a bit syntax segment size having an literal non-integer size such as [].

Own Id: OTP-18307 Aux Id: GH-6419, GH-6473

Dialyzer could crash when trying to analyze a convoluted nested expression involving funs,

Own Id: OTP-18347 Aux Id: GH-6518, PR-6525

Dialyzer 5.0.3

Fixed Bugs and Malfunctions

Dialyzer could crash when analyzing Elixir code that used intricate macros.

Own Id: OTP-18262 Aux Id: GH-6323

Improvements and New Features

The --input_list_file option has been added.

Own Id: OTP-18263 Aux Id: ERIERL-821

Dialyzer 5.0.2

Fixed Bugs and Malfunctions

Two bugs have been fixed in Dialyzer's checking of behaviors:

When a mandatory callback function is present but not exported, Dialyzer would not complain about a missing callback.

When an optional callback function was not exported and had incompatible arguments and/or the return values were incompatible, Dialyzer would complain. This has been changed to suppress the warning, because the function might not be intended to be a callback function, for instance if a release added a new optional callback function (such as format_status/1 for the gen_server behaviour added in OTP 25).

Own Id: OTP-18127 Aux Id: ERIERL-817

The no_extra_return and no_missing_return warnings can now be suppressed through -dialyzer directives in source code.

Own Id: OTP-18148 Aux Id: PR-6068

Dialyzer 5.0.1

Fixed Bugs and Malfunctions

Fixed the documentation for the missing_return and extra_return options.

Own Id: OTP-18120

Dialyzer 5.0

Fixed Bugs and Malfunctions

Fixed a bug that could cause the type analyzer to enter an infinite loop.

* POTENTIAL INCOMPATIBILITY *

Own Id: OTP-17644 Aux Id: PR-5223

Improvements and New Features

Optimize operations in the erl_types module. Parallelize the Dialyzer pass remote.

Own Id: OTP-17524

Added the missing_return and extra_return options to raise warnings when specifications differ from inferred types. These are similar to, but not quite as verbose as overspecs and underspecs.

Own Id: OTP-17654 Aux Id: GH-5214

The race_conditions option has been removed.

Own Id: OTP-17819

The default location of the plt has been changed from $HOME to filename:basedir(user_cache,"erlang").

* POTENTIAL INCOMPATIBILITY *

Own Id: OTP-17821 Aux Id: GH-5016 PR-5408 OTP-17554

dialyzer will now honor dependencies inside type declarations. That is, if the declaration of an exported type changes, all modules using said type will be revisited.

Own Id: OTP-17826 Aux Id: PR-5498

Dialyzer now better understands the types for min/2, max/2, and erlang:raise/3. Because of that, Dialyzer can potentially generate new warnings. In particular, functions that use erlang:raise/3 could now need a spec with a no_return/0 return type to avoid an unwanted warning.

Own Id: OTP-17897 Aux Id: PR-5651

The typer_core module has been added to provide an Erlang API for running typer.

Own Id: OTP-17964 Aux Id: PR-5660

Added the --annotate-in-place option to typer, which can be used to annotate the specs that the tool inferred directly into the source code files.

Own Id: OTP-18035 Aux Id: PR-5802

Dialyzer 4.4.4.1

Improvements and New Features

The --input_list_file option has been added.

Own Id: OTP-18263 Aux Id: ERIERL-821

Dialyzer 4.4.4

Fixed Bugs and Malfunctions

There could be spurious warnings for unknown types when a type was a subtype of an existing type that was a subtype of an unknown type.

Own Id: OTP-17963 Aux Id: GH-5764

Dialyzer 4.4.3

Fixed Bugs and Malfunctions

Fixed a crash when opaque types contained certain unicode characters.

Own Id: OTP-17643 Aux Id: GH-5210

When the compiler is invoked by Dialyzer, it will no longer apply an optimization of binary patterns that would turn the pattern <<"bar">> into <<6447474:24>>, which would be very confusing when printed out by Dialyzer.

Own Id: OTP-17768 Aux Id: GH-5429

Dialyzer 4.4.2

Fixed Bugs and Malfunctions

Do not crash if a PLT file no longer exists.

Own Id: OTP-17511 Aux Id: GH-4501

Fix bug in erl_types related to maps.

Own Id: OTP-17537

Fix bugs in erl_types regarding improper lists.

Own Id: OTP-17541

The underspecs and overspecs options will now generate correct warnings for misused opaque types.

Own Id: OTP-17616 Aux Id: GH-5118

Dialyzer 4.4.1

Fixed Bugs and Malfunctions

Do not expose line number 0 in messages if there are other locations to use.

Own Id: OTP-17443 Aux Id: GH-4890

In rare circumstances, Dialyzer could crash analyzing code with a list comprehension whose value was ignored. (Thanks to Ulf Wiger for reporting this bug.)

Own Id: OTP-17482

Dialyzer 4.4

Improvements and New Features

Some internal HiPE modules have been moved into the dialyzer application so that dialyzer works when HiPE is disabled.

Own Id: OTP-16883

The experimental HiPE application has been removed, together with all related functionality in other applications.

* POTENTIAL INCOMPATIBILITY *

Own Id: OTP-16963

Add warning option no_underspecs.

Own Id: OTP-16986 Aux Id: ERL-1379, ERL-1480, GH-4033

Report filename and location for warnings returned due to the -Wunknown option. When used from the command-line, one location per file is printed.

Own Id: OTP-16995 Aux Id: ERL-1348

Add types and specifications for documentation.

Own Id: OTP-17084

Add option error_location. The option is recognized if included in the environment variable ERL_COMPILER_OPTIONS.

Own Id: OTP-17177 Aux Id: OTP-16824

Clarify how to declare records used in match patterns.

Own Id: OTP-17183 Aux Id: ERL-892, GH-4493

Dialyzer 4.3.1.2

Improvements and New Features

The --input_list_file option has been added.

Own Id: OTP-18263 Aux Id: ERIERL-821

Dialyzer 4.3.1.1

Fixed Bugs and Malfunctions

In rare circumstances, Dialyzer could crash analyzing code with a list comprehension whose value was ignored. (Thanks to Ulf Wiger for reporting this bug.)

Own Id: OTP-17482

Dialyzer 4.3.1

Fixed Bugs and Malfunctions

Correct handling of PLTs in the GUI.

Own Id: OTP-17091

Dialyzer 4.3

Improvements and New Features

Clarify warning option -Wunmatched_returns in dialyzer.

Own Id: OTP-17068 Aux Id: ERL-1223

Dialyzer 4.2.1

Fixed Bugs and Malfunctions

In rare circumstance, dialyzer wold crash when analyzing a list comprehension.

Own Id: OTP-16813 Aux Id: ERL-1307

Dialyzer 4.2

Improvements and New Features

Improve handling of maps:remove/2.

Own Id: OTP-16055 Aux Id: ERL-1002

Dialyzer 4.1.1

Fixed Bugs and Malfunctions

Fix a bug where warnings about overspecified functions were erroneously emitted. Only overloaded functions were affected by the bug.

Own Id: OTP-16292

Improvements and New Features

Remove test data with GNU license.

Own Id: OTP-16146

Dialyzer 4.1

Improvements and New Features

Allow native compilation when using Dialyzer from Erlang. The options native (defaults to false) and native_cache have been added.

Own Id: OTP-15880 Aux Id: PR-2283

Dialyzer 4.0.3

Fixed Bugs and Malfunctions

The HiPE compiler would badly miscompile certain try/catch expressions, so it will now refuse to compile modules containing try or catch.

As a consequence of this, dialyzer will no longer compile key modules to native code.

* POTENTIAL INCOMPATIBILITY *

Own Id: OTP-15949

Dialyzer 4.0.2

Fixed Bugs and Malfunctions

Make sure Dialyzer does not crash if the formatting of results fails. Instead of crashing, an unformatted version of the results is returned.

Own Id: OTP-15922 Aux Id: PR-2240, ERL-949

Dialyzer 4.0.1

Fixed Bugs and Malfunctions

Fix a bug that caused a crash when indenting a Dialyzer warning mentioning more than one record field.

Own Id: OTP-15861 Aux Id: ERL-953

Dialyzer 4.0

Fixed Bugs and Malfunctions

All incorrect (that is, all) uses of "can not" has been corrected to "cannot" in source code comments, documentation, examples, and so on.

Own Id: OTP-14282 Aux Id: PR-1891

Improvements and New Features

By default Dialyzer inserts line breaks in types, contracts, and Erlang Code when formatting results. Use the new --no_indentation option to get the old behavior of not inserting line breaks.

Own Id: OTP-15135

Use bit syntax in warnings instead of Core Erlang syntax, for readability.

Own Id: OTP-15752

The format of the raw analysis result tagged with fun_app_args is changed to {fun_app_args, [ArgNs, Args, Type]}.

* POTENTIAL INCOMPATIBILITY *

Own Id: OTP-15779

Dialyzer 3.3.2

Fixed Bugs and Malfunctions

Fix a bug that caused Dialyzer to crash when analyzing a contract with a module name differing from the analyzed module's name. The bug was introduced in Erlang/OTP 18.

Own Id: OTP-15562 Aux Id: ERL-845

Fix a bug in the handling of the Key argument of lists:{keysearch, keyfind, keymember}.

Own Id: OTP-15570

Optimize (again) Dialyzer's handling of left-associative use of andalso and orelse in guards.

Own Id: OTP-15577 Aux Id: ERL-851, PR-2141, PR-1944

Dialyzer 3.3.1

Improvements and New Features

Optimize Dialyzer's handling of left-associative use of andalso and orelse in guards.

Own Id: OTP-15268 Aux Id: ERL-680

Dialyzer 3.3

Improvements and New Features

Changed the default behaviour of .erlang loading: .erlang is no longer loaded from the current directory. c:erlangrc(PathList) can be used to search and load an .erlang file from user specified directories.

escript, erlc, dialyzer and typer no longer load an .erlang at all.

* POTENTIAL INCOMPATIBILITY *

Own Id: OTP-14439

Dialyzer can no longer read BEAM files created with OTP 19 or earlier.

Own Id: OTP-14493 Aux Id: PR-1434

Speed up the computation of MD5 sums.

Own Id: OTP-14937 Aux Id: PR-1719

Fix a situation where Dialyzer unnecessarily discarded contract information, resulting in missed warnings.

Own Id: OTP-14970 Aux Id: PR-1722

The (not recommended) option -Woverspecs is somewhat refined, and generates warnings in a few more cases.

Own Id: OTP-14982 Aux Id: OTP-14970, PR-1722

Do not emit warnings for fun expressions residing in code that cannot be run. This is consistent with how Dialyzer treats other code that cannot be run.

Own Id: OTP-15079 Aux Id: ERL-593

Dialyzer 3.2.4

Fixed Bugs and Malfunctions

Fix bugs concerning erlang:abs/1 and erlang:bsl/2.

Own Id: OTP-14858 Aux Id: ERL-551

Fix a bug that caused Dialyzer to crash instead of emitting a warning.

Own Id: OTP-14911

Fix a bug concerning parameterized opaque types.

Own Id: OTP-14925 Aux Id: ERL-565

Dialyzer 3.2.3

Fixed Bugs and Malfunctions

The error message returned from Dialyzer when, for example, a modified record field type is not a subtype of the declared type, no longer includes a call stack. The bug was introduced in Erlang/OTP 19.3.

Own Id: OTP-14742

A bug relating to maps and never returning functions has been fixed.

Own Id: OTP-14743

Dialyzer 3.2.2

Fixed Bugs and Malfunctions

Fix a bug regarding map types that caused Dialyzer to go into an infinite loop. A consequence of the fix is that compound map keys such as maps and tuples sometimes are handled with less precision than before.

Own Id: OTP-14572 Aux Id: seq13319

Improvements and New Features

General Unicode improvements.

Own Id: OTP-14462

The check for unknown remote types is improved.

Own Id: OTP-14606 Aux Id: OTP-14218

Dialyzer 3.2.1

Fixed Bugs and Malfunctions

Fix a bug where merging PLT:s could lose info. The bug was introduced in Erlang/OTP 20.0.

Own Id: OTP-14558 Aux Id: ERIERL-53

Dialyzer 3.2

Fixed Bugs and Malfunctions

The check of bad type variables in type declarations was mistakingly removed in Erlang/OTP 18, and is now re-introduced.

Own Id: OTP-14423 Aux Id: OTP-14323

Improvements and New Features

Analyzing modules with binary construction with huge strings is now much faster. The compiler also compiles such modules slightly faster.

Own Id: OTP-14125 Aux Id: ERL-308

The peak memory consumption is reduced.

Own Id: OTP-14127

Warnings about unknown types are now also generated for types not used by any function specification.

Own Id: OTP-14218 Aux Id: OTP-14127

TypEr has been removed as separate application and is now a part of the Dialyzer application. Documentation for TypEr has been added in the Dialyzer application.

Own Id: OTP-14336

The format of debug information that is stored in BEAM files (when debug_info is used) has been changed. The purpose of the change is to better support other BEAM-based languages such as Elixir or LFE.

All tools included in OTP (dialyzer, debugger, cover, and so on) will handle both the new format and the previous format. Tools that retrieve the debug information using beam_lib:chunk(Beam, [abstract_code]) will continue to work with both the new and old format. Tools that call beam_lib:chunk(Beam, ["Abst"]) will not work with the new format.

For more information, see the description of debug_info in the documentation for beam_lib and the description of the {debug_info,{Backend,Data}} option in the documentation for compile.

Own Id: OTP-14369 Aux Id: PR-1367

Dialyzer 3.1.1

Fixed Bugs and Malfunctions

Report unknown types properly. A bug was introduced in Erlang/OTP 19.3, where warnings about unknown types were simply discarded.

Own Id: OTP-14368

Dialyzer 3.1

Fixed Bugs and Malfunctions

Fix a bug concerning parameterized opaque types.

Own Id: OTP-14130

Improve a few warnings. One of them could cause a crash.

Own Id: OTP-14177

The dialyzer and observer applications will now use a portable way to find the home directory. That means that there is no longer any need to manually set the HOME environment variable on Windows.

Own Id: OTP-14249 Aux Id: ERL-161

Improvements and New Features

The peak memory consumption is reduced.

The evaluation of huge SCCs in dialyzer_typesig is optimized.

Analyzing modules with binary construction with huge strings is now much faster.

Own Id: OTP-14126 Aux Id: ERL-308

Dialyzer 3.0.3

Fixed Bugs and Malfunctions

Fix bugs regarding opaque types.

Own Id: OTP-13693

Fix error handling of bad -dialyzer() attributes.

Own Id: OTP-13979 Aux Id: ERL-283

Improvements and New Features

A few warning messages have been improved.

Own Id: OTP-11403

Dialyzer 3.0.2

Improvements and New Features

The translation of forms to types is improved for opaque types in a few cases.

Own Id: OTP-13682

Add warning suppression to compiler-generated case statements. Warnings about clauses that cannot match and are also compiler generated are suppressed unless none of the clauses return.

Own Id: OTP-13723 Aux Id: ERL-159, PR-1121

Dialyzer 3.0.1

Fixed Bugs and Malfunctions

Fix a map related bug.

Own Id: OTP-13709 Aux Id: ERL-177, PR-1115

Dialyzer 3.0

Fixed Bugs and Malfunctions

Fix a bug in the translation of forms to types.

Own Id: OTP-13520

Correct misspelling in Dialyzer's acronym definition.

Own Id: OTP-13544 Aux Id: PR-1007

Dialyzer no longer crashes when there is an invalid function call such as 42(7) in a module being analyzed. The compiler will now warn for invalid function calls such as X = 42, x(7).

Own Id: OTP-13552 Aux Id: ERL-138

Fix a bug that caused Dialyzer to go into an infinite loop.

Own Id: OTP-13653 Aux Id: ERL-157

Fix a bug in Dialyzer related to call-site analysis.

Own Id: OTP-13655 Aux Id: PR-1092

Improvements and New Features

The evaluation of SCCs in dialyzer_typesig is optimized.

Maps are used instead of Dicts to further optimize the evaluation.

Own Id: OTP-10349

Since Erlang/OTP R14A, when support for parameterized modules was added, module/0 has included tuple/0, but that part is removed; the type module/0 is now the same as atom/0, as documented in the Reference Manual.

Own Id: OTP-13244

The type specification syntax for Maps is improved:

The association type KeyType := ValueType denotes an association that must be present.

The shorthand ... stands for the association type any() => any().

An incompatible change is that #{} stands for the empty map. The type map/0 (a map of any size) can be written as #{...}.

* POTENTIAL INCOMPATIBILITY *

Own Id: OTP-13542 Aux Id: PR-1014

The translation of forms to types is improved.

Own Id: OTP-13547

Dialyzer 2.9

Fixed Bugs and Malfunctions

Dialyzer no longer asserts that files and directories to be removed from a PLT exist.

Own Id: OTP-13103 Aux Id: ERL-40

Fix a bug concerning parameterized opaque types.

Own Id: OTP-13237

Fix pretty printing of Core Maps

Literal maps could cause Dialyzer to crash when pretty printing the results.

Own Id: OTP-13238

If a behavior module contains an non-exported function with the same name as one of the behavior's callbacks, the callback info was inadvertently deleted from the PLT as the dialyzer_plt:delete_list/2 function was cleaning up the callback table.

Own Id: OTP-13287

Correct the contract for erlang:byte_size/1

Correct the handling of comparison operators for map and bit string operands.

Own Id: OTP-13312

Improvements and New Features

Dialyzer recognizes calls to M:F/A where M, F, and A are all literals.

Own Id: OTP-13217

Dialyzer 2.8.2

Fixed Bugs and Malfunctions

Reintroduce the erlang:make_fun/3 BIF in erl_bif_types.

Own Id: OTP-13068

Dialyzer 2.8.1

Fixed Bugs and Malfunctions

Improve the translation of forms to types.

Own Id: OTP-12865

Fix a bug concerning parameterized opaque types.

Own Id: OTP-12866

Fix a bug concerning parameterized opaque types.

Own Id: OTP-12940

Fix bugs concerning erlang:abs/1.

Own Id: OTP-12948

Fix a bug concerning lists:keydelete/3 with union and opaque types.

Own Id: OTP-12949

Use new function hipe:erts_checksum to get correct runtime checksum for cached beam files.

Own Id: OTP-12964 Aux Id: OTP-12963, OTP-12962

Dialyzer 2.8

Fixed Bugs and Malfunctions

The translation of Erlang forms to the type representation used by Dialyzer has been improved in several ways. The most important change is that deeply nested records can be handled.

Own Id: OTP-12350

Fix a bug that could cause bogus warnings for opaque types.

In Erlang/OTP 18 two parameterized types declared in the same module always result in a contradiction (none/0) when combined outside of the module where they are declared, unless they have the same number of parameters.

The behaviour is different from Erlang/OTP 17 where, for instance, dict:dict() and dict:dict(_, _), which are both opaque, can be combined outside of the dict module.

In Erlang/OTP 18, dict:dict() and dict:dict(_, _) can still be combined outside of the dict module. That has been made possible by not declaring dict:dict() as opaque.

Own Id: OTP-12493

Update the PLT properly when a module is changed. (Thanks to James Fish for the bug report, and to Stavros Aronis for fixing the bug.)

Own Id: OTP-12637

An argument of '*'/2 is not constraind if the other operand can be zero.

Own Id: OTP-12725

Mention the option check_plt among the dialyzer:gui() options. (Thanks to James Fish.)

Own Id: OTP-12750

Fix a bug which could cause an infinite loop in Dialyzer.

Own Id: OTP-12826

Improvements and New Features

The -dialyzer() attribute can be used for suppressing warnings in a module by specifying functions or warning options. It can also be used for requesting warnings in a module.

Own Id: OTP-10280

The pre-defined types array(), dict(), digraph(), gb_set(), gb_tree(), queue(), set(), and tid() have been removed.

Own Id: OTP-11445 Aux Id: OTP-10342, OTP-9352

A few type names that have been used for representing certain predefined types can now be used for user-defined types. This affects the types product/_, union/_, and range/2 as well as tuple/N (N > 0), map/N (N > 0), atom/1, integer/1, binary/2, record/_, and 'fun'/_. A consequence is that, for example, it is no longer possible to refer to a record type with record(r); instead the usual record notation, #r{}, is to be used.

* POTENTIAL INCOMPATIBILITY *

Own Id: OTP-11851

When implementing user-defined behaviours it is now possible to specify optional callback functions. See OTP Design Principles User's Guide, Sys and Proc_Lib, User-Defined Behaviours, for details.

Own Id: OTP-11861

Add two options to the Dialyzer: no_missing_calls suppresses warnings about calls to missing or unexported functions; unknown lets warnings about unknown functions or types affect the exit status. See also dialyzer(3).

Own Id: OTP-12682

By default, dialyzer will now cache native versions of dialyzer modules to avoid having to re-compile them each time dialyzer is started. Caching can be disabled using the option --no_native_cache.

Own Id: OTP-12779

Dialyzer 2.7.4

Fixed Bugs and Malfunctions

A bug concerning map/0 types has been fixed.

Own Id: OTP-12472

Dialyzer 2.7.3

Fixed Bugs and Malfunctions

When compiling Erlang source, Dialyzer now ignores the environment variable ERL_COMPILER_OPTIONS as well as skips the Erlang Compiler option warnings_as_errors.

Own Id: OTP-12225

Dialyzer did not check the type of record elements when updating them. The bug, introduced in Erlang/OTP 17.1, has been corrected. (Thanks to Nicolas Dudebout for pointing it out.)

Own Id: OTP-12319

Coalesce map keys in dialyzer mode

This fixes a regression introduced in commit 805f9c89fc01220bc1bb0f27e1b68fd4eca688ba The problem occurred with compounded map keys compiled with dialyzer option turned on, '+dialyzer'.

Reported by: Ivan Uemlianin

Own Id: OTP-12347

Dialyzer 2.7.2

Fixed Bugs and Malfunctions

A bug concerning is_record/2,3 has been fixed, as well as some cases where Dialyzer could crash due to reaching system limits.

Own Id: OTP-12018

When given the -Wunderspecs flag Dialyzer sometimes output bogus warnings for parametrized types. This bug has been fixed.

Own Id: OTP-12111

Dialyzer now fetch the compile options from beam files, and use them when creating core from the abstract code. Previously the options were ignored.

Own Id: OTP-12150

Dialyzer 2.7.1

Fixed Bugs and Malfunctions

Fix a bug concerning opaque types. Thanks to Shayan Pooya for pointing out the bug.

Own Id: OTP-11869

A bug where Dialyzer failed to handle typed records with fields containing remote types has been fixed. Thanks to Erik Søe Sørensen for reporting the bug.

Own Id: OTP-11918

Make sure that only literal records are checked against the types of record definitions. Until now the elements of tuples have been checked against record field types if the tag och size of the tuple matches the record definition, often with surprising results.

Own Id: OTP-11935 Aux Id: seq12590

A Dialyzer crash involving analysis of Map types has now been fixed.

Own Id: OTP-11947

Dialyzer 2.7

Fixed Bugs and Malfunctions

Dialyzer will no longer emit warnings when inspecting or modifying opaque types within the scope of a module.

Hitherto the shape of terms (tuple, list, etc.) has been used to determine the opaque terms, but now the contracts are used for decorating types with opacity.

Own Id: OTP-10397

With --Wunmatched_returns, dialyzer will no longer warn when the value of a list comprehension is ignored, provided that the each value in the list would be an atomic value (such as integer or atoms, as opposed to tuples and lists). Example: ignoring '[io:format(...) || ...]' will not cause a warning, while ignoring '[file:close(Fd) || ...]' will.

Own Id: OTP-11626

The man page for dialyzer now contains correct information regarding -Wno_behaviours. (Thanks to Steve Vinosky.)

Own Id: OTP-11706

Fix handling of 'on_load' attribute. (Thanks to Kostis Sagonas.)

Own Id: OTP-11743

Application upgrade (appup) files are corrected for the following applications:

asn1, common_test, compiler, crypto, debugger, dialyzer, edoc, eldap, erl_docgen, et, eunit, gs, hipe, inets, observer, odbc, os_mon, otp_mibs, parsetools, percept, public_key, reltool, runtime_tools, ssh, syntax_tools, test_server, tools, typer, webtool, wx, xmerl

A new test utility for testing appup files is added to test_server. This is now used by most applications in OTP.

(Thanks to Tobias Schlager)

Own Id: OTP-11744

The generalization of guard constraints has been modified.

Own Id: OTP-11798 Aux Id: seq12547

Dialyzer now plays nicely with funs that come as "external" arguments. (Thanks to Stavros Aronis for fixing the bug.)

Own Id: OTP-11826

Improvements and New Features

The pre-defined types array/0, dict/0, digraph/0, gb_set/0, gb_tree/0, queue/0, set/0, and tid/0 have been deprecated. They will be removed in Erlang/OTP 18.0.

Instead the types array:array/0, dict:dict/0, digraph:graph/0, gb_set:set/0, gb_tree:tree/0, queue:queue/0, sets:set/0, and ets:tid/0 can be used. (Note: it has always been necessary to use ets:tid/0.)

It is allowed in Erlang/OTP 17.0 to locally re-define the types array/0, dict/0, and so on.

New types array:array/1, dict:dict/2, gb_sets:set/1, gb_trees:tree/2, queue:queue/1, and sets:set/1 have been added.

A compiler option, nowarn_deprecated_type, has been introduced. By including the attribute

-compile(nowarn_deprecated_type).

in an Erlang source file, warnings about deprecated types can be avoided in Erlang/OTP 17.0.

The option can also be given as a compiler flag:

erlc +nowarn_deprecated_type file.erl

Own Id: OTP-10342

Removed gs based applications and gs based backends. The observer application replaces the removed applications.

* POTENTIAL INCOMPATIBILITY *

Own Id: OTP-10915

Forbid unsized fields in patterns of binary generators and simplified v3_core's translation of bit string generators. (Thanks to Anthony Ramine.)

Own Id: OTP-11186

EEP43: New data type - Maps

With Maps you may for instance:

____ - M0 = #{ a => 1, b => 2}, % create associations

____ - M1 = M0#{ a := 10 }, % update values

____ - M2 = M1#{ "hi" => "hello"}, % add new associations

____ - #{ "hi" := V1, a := V2, b := V3} = M2. % match keys with values

For information on how to use Maps please see Map Expressions in the Reference Manual.

The current implementation is without the following features:

____ - No variable keys

____ - No single value access

____ - No map comprehensions

Note that Maps is experimental during OTP 17.0.

Own Id: OTP-11616

Parameterized opaque types have been introduced.

Own Id: OTP-11625

Some function specs are corrected or moved and some edoc comments are corrected in order to allow use of edoc. (Thanks to Pierre Fenoll)

Own Id: OTP-11702

Dialyzer 2.6.1

Fixed Bugs and Malfunctions

A bug that made it impossible to do any analyses from the GUI has been fixed.

Own Id: OTP-11057 Aux Id: seq12313

Improvements and New Features

Include module, function and arity in Dialyzer's "overlapping domain" warnings. Thanks to Magnus Henoch.

Own Id: OTP-10918

Improve Dialyzer output for scan errors. Thanks to Magnus Henoch.

Own Id: OTP-10996

Integrate elliptic curve contribution from Andreas Schultz

In order to be able to support elliptic curve cipher suites in SSL/TLS, additions to handle elliptic curve infrastructure has been added to public_key and crypto.

This also has resulted in a rewrite of the crypto API to gain consistency and remove unnecessary overhead. All OTP applications using crypto has been updated to use the new API.

Impact: Elliptic curve cryptography (ECC) offers equivalent security with smaller key sizes than other public key algorithms. Smaller key sizes result in savings for power, memory, bandwidth, and computational cost that make ECC especially attractive for constrained environments.

Own Id: OTP-11009

Bitstring type inference and duplicate module error message fixes. Thanks to Stavros Aronis.

Own Id: OTP-11027

Erlang source files with non-ASCII characters are now encoded in UTF-8 (instead of latin1).

Own Id: OTP-11041 Aux Id: OTP-10907

Dialyzer 2.6

Improvements and New Features

Miscellaneous updates due to Unicode support.

Own Id: OTP-10820

User defined types with same name and different arity and documentation inconsistencies. Thanks Stavros Aronis.

Own Id: OTP-10861

Native code compilation changes. Thanks to Kostis Sagonas.

Own Id: OTP-10865

Dialyzer 2.5.4

Improvements and New Features

Support for Unicode has been implemented.

Own Id: OTP-10302

Dialyzer no longer outputs warnings for unused anonymous functions ("funs"). Warnings are still output for unused functions.

Own Id: OTP-10433

Where necessary a comment stating encoding has been added to Erlang files. The comment is meant to be removed in Erlang/OTP R17B when UTF-8 becomes the default encoding.

Own Id: OTP-10630

Some examples overflowing the width of PDF pages have been corrected.

Own Id: OTP-10665

Fix precision of record creation violation warnings. Thanks to Stavros Aronis

Own Id: OTP-10681

Report spec discrepancy on mismatching lists. Thanks to Stavros Aronis.

Own Id: OTP-10740

Properly support functions with arbitrary arity in type specs. Thanks to Stavros Aronis.

Own Id: OTP-10772

Dialyzer 2.5.3

Fixed Bugs and Malfunctions

Fix a crash in race condition detection

Remove old untested experimental extension

Respect {plt_check,false} option when using dialyzer:run/1

Fix handling of tuple set remote types appearing in tuple sets

Own Id: OTP-10464

Dialyzer 2.5.2

Fixed Bugs and Malfunctions

Correct handling of type names in contracts. Fix crash related to contract checking. Do not rewrite unchanged PLT.

Own Id: OTP-10083

Stop a forgotten server process

Dialyzer forgot to stop a server process before finishing its analysis. This is a concurrency error detected by Concuerror. Changes to fix warnings identified by running dialyzer -Wunmatched_returns. Thanks to Kostis Sagonas.

Own Id: OTP-10231

Improvements and New Features

Bug fixes and improvements of dialyzer_typesig.

Own Id: OTP-10082

Add parallel dialyzer support

Own Id: OTP-10103

An alternative implementation of the solver in dialyzer_typesig has been introduced. It is faster than the original implementation.

Own Id: OTP-10110

Bugs in erl_types:t_inf() (HiPE) and in dialyzer_dataflow (Dialyzer) have been fixed.

Own Id: OTP-10191

Dialyzer 2.5.1

Improvements and New Features

Handle nowarn_unused_function the same way as the compiler does.

Own Id: OTP-9833

Dialyzer 2.5

Fixed Bugs and Malfunctions

Fix false warning about closure application

Whenever a variable that could hold one of two or more possible closures was used in a particular application, the application was assumed to fail if ONE of the closures would fail in this application. This has been corrected to infer failing application if ALL possible closures would fail in the particular application.

Change category of 'might also return' warnings

Dialyzer emits warnings like the following "The specification for _ states that the function might also return but the inferred return is ", which are actually underspecifications and not wrong type specifications. This patch makes sure that they are filed under the appropriate category.

Own Id: OTP-9707

Wrap up behaviours patch for Dialyzer

Enable warnings by default, add two options for suppressing them

Fix warning formatting and update testsuites.

Detection of callback-spec discrepancies

Allow none() as return value in callbacks

Behaviour callback discrepancy detection for Dialyzer

Add lookup function for callbacks

Store callbacks in codeserver and PLT

Collect callback definitions during compilation

Update inets results

Own Id: OTP-9731

No warnings for underspecs with remote types

Fix crash in Typer

Fix Dialyzer's warning for its own code

Fix Dialyzer's warnings in HiPE

Add file/line info in a particular Dialyzer crash

Update inets test results

Own Id: OTP-9758

Correct callback spec in application module

Refine warning about callback specs with extra ranges

Cleanup autoimport compiler directives

Fix Dialyzer's warnings in typer

Fix Dialyzer's warning for its own code

Fix bug in Dialyzer's behaviours analysis

Fix crash in Dialyzer

Variable substitution was not generalizing any unknown variables.

Own Id: OTP-9776

Improvements and New Features

Optimize the joining of maps in dialyzer_dataflow.

Own Id: OTP-9761

Dialyzer 2.4.4

Fixed Bugs and Malfunctions

Update results of race_SUITE/extract_translations Update results of small_SUITE/flatten Add codec_can and list_to_bitstring tests Fix bug when reporting unused functions Update Dialyzer r9c_suite results Fix dialyzer warning on default clause for binary comprehension (Thanks to Ivan Dubrov)

Own Id: OTP-9483

Fix server loop detection

Dialyzer does not normally emit warnings for functions that implement non-terminating server loops. This detection failed when some of the elements in an SCC terminated normally (being for example list comprehensions or other generic anonymous functions that were included in the SCC). This patch fixes that.

Own Id: OTP-9489

Add a proplist() type

Recently I was adding specs to an API and found that there is no canonical proplist() type defined. (Thanks to Ryan Zezeski)

Own Id: OTP-9499

Suppress some warnings about generation of non-returning funs

No warnings are emitted for funs that are non-returning when the function that generates them has a contract that specifies that it will return such a non-returning fun.

Enhance Dialyzer's inference on comparisons

This patch makes Dialyzer aware of Erlang's total ordering of terms, enabling discrepancy detection in cases where e.g. integer() < tuple() is treated as a comparison that might also return false (when it is certain to always return true).

Minor fix in dead code

Fix infinite loop in dataflow

Update r9c/{inets,mnesia} results in dialyzer's test suite

Add origin information to #fun_var closures

(Thanks to Tuncer Ayaz and Maria Christakis)

Own Id: OTP-9529

Quote atoms if necessary in types

Atoms in some occurrences were not correctly quoted when formatted to strings, for instance by the typer program (Thanks to Tomas Abrahamsson)

Update Dialyzer's reference results

Own Id: OTP-9560

Fix typer's crash for nonexisting files Remove unused macro Fix bug in dataflow Decrease tuple arity limit This fixes a memory related crash.

Own Id: OTP-9597

Improvements and New Features

Types for several BIFs have been extended/corrected. Also the types for types for lists:keyfind/3, lists:keysearch/3, and lists:keyemember/3 have been corrected. The incorrect/incomplete types could cause false dialyzer warnings.

Own Id: OTP-9496

Dialyzer 2.4.3

Fixed Bugs and Malfunctions

Fix the name of an error function(Thanks to Maria christakis)

Own Id: OTP-9175

Fix crash related with the contract blame assignment patch

Own Id: OTP-9219

dialyzer/doc: synchronize manual.txt and dialyzer.xml (Thanks to Tuncer Ayaz)

Own Id: OTP-9226

Simplify Dialyzer's test suite structure

*_SUITE.erl files are now automatically generated by the respective data directories by the Makefile.

Own Id: OTP-9278

Dialyzer 2.4.2

Fixed Bugs and Malfunctions

Add a --fullpath option to Dialyzer

This change adds a --fullpath option to Dialyzer, which makes the warning messages contain the full path of the corresponding file.

Original patch submitted by Magnus Henoch (legoscia) on 15/9/2010 and cooked to death in the 'pu' branch all this time.

The patch was essentially correct and most of it has been used as is, but there have been some changes to make the code slightly prettier, avoid some code duplication, and add documentation to dialyzer's doc files and to its help message.

Own Id: OTP-9098

Fix warnings about guards containing not

The wording of warnings about unsatisfiable guards that used 'not' was incorrect (the 'not' was not mentioned and it appeared as "Guard test is_atom(atom()) can never succeed") (thanks to Stavros Aronis).

Own Id: OTP-9099

Version 2.4.2 (in Erlang/OTP R14B02) ------------------------------------ - Added --fullpath option to display files with warnings with their full file names (thanks to Magnus Henoch for the original patch). - Better handling of 'and'/'or'/'not' guards that generate warnings (thanks to Stavros Aronis). - Better blame assignment for cases when a function's spec is erroneous (thanks to Stavros Aronis). - More descriptive warnings when a tuple/record pattern contains subterms that violate the declared types of record fields (thanks to Matthias Lang for the test case and for Stavros Aronis for the actual fix).

Own Id: OTP-9126

Add spec to dialyzer_cl_parse:get_lib_dir/1

Own Id: OTP-9129

Improvements and New Features

Test suites for Dialyzer

This is a transcription of most of the cvs.srv.it.uu.se:/hipe repository dialyzer_tests into test suites that use the test server framework.

See README for information on how to use the included scripts for modifications and updates.

When testing Dialyzer it's important that several OTP modules are included in the plt. The suites takes care of that too.

Own Id: OTP-9116

Dialyzer 2.4.0

Fixed Bugs and Malfunctions

- Fixed pretty rare infinite loop when refining the types of an SCC whose functions all returned none() (thanks to Stavros Aronis).

- Fixed pretty rare crash when taking the infimum of two tuple_sets.

Own Id: OTP-8979

Improvements and New Features

- Added ability to supply multiple PLTs for the analysis (option --plts). Currently these PLTs must be independent (i.e., no module appears in more than one PLT) and there must not include files with module name clashes.

- Strengthened and streamlined hard-coded type information for some BIFs and key library functions.

Own Id: OTP-8962

Dialyzer 2.3.1

Improvements and New Features

Eliminated warnings for auto-imported BIF clashes.

Own Id: OTP-8840

Dialyzer 2.3.0

Improvements and New Features

Various changes to dialyzer-related files for R14.

- Dialyzer properly supports the new attribute -export_type and checks that remote types only refer to exported types. A warning is produced if some files/applications refer to types defined in modules which are neither in the PLT nor in the analyzed applications.

- Support for detecting data races involving whereis/1 and unregister/1.

- More precise identification of the reason(s) why a record construction violates the types declared for its fields.

- Fixed bug in the handling of the 'or' guard.

- Better handling of the erlang:element/2 BIF.

- Complete handling of Erlang BIFs.

Own Id: OTP-8699

Dialyzer 2.2.0

Improvements and New Features

Much better support for opaque types (thanks to Manouk Manoukian).

Added support for recursive types (experimental).

Added support for parameterized modules.

Dialyzer now warns when -specs state that a function returns some type when in fact it does not.

Added --no_native (-nn) option so that the user can bypass the native code compilation that dialyzer heuristically performs when dialyzing many files.

Fixed minor bug in the dialyzer script allowing the --wx option to bring up the wx-based GUI regardless of its placement in the options list.

Options --apps and -Wrace_conditions, which were added in the previous version, are now properly documented in the manual.

Own Id: OTP-8464

Dialyzer 2.1.0

Improvements and New Features

The documentation is now built with open source tools (xsltproc and fop) that exists on most platforms. One visible change is that the frames are removed.

Own Id: OTP-8201

Dialyzer can statically detect some kinds of data races in Erlang programs. Use the new option -Wrace_conditions to enable the race analysis. The technique is described in a paper which is available at: http://www.it.uu.se/research/group/hipe/dialyzer/publications/races.pdf

Added support for packages (thanks to Maria Christakis).

There has been a major change in the default mode of Dialyzer. Previously, the default mode was the GUI, while now it is the command line. As a result of this change, it is now possible to analyze a set of files/dirs with the command:

dialyzer file1 ... fileN

In other words, the -c (--command-line) option is no longer necessary, though it will be retained for some time for backwards compatibility. To start dialyzer's GUI use either of the following commands:

dialyzer --gui %% for the old gs-based GUI

dialyzer --wx %% for the new wx-based GUI (where available)

There is a new option --apps which allows the user to easily refer to Erlang/OTP applications and include them in the analysis or in the building of the PLT. For example, we recommend building the PLT with:

dialyzer --build_plt --apps erts kernel stdlib mnesia ...

The new option can also take absolute file names as well as applications. Note that the application versions that will be included in the PLT are those that correspond to the Erlang/OTP system which is used.

Dialyzer has a new wxWidgets based GUI (thanks to Elli Frangaki) for platforms where the wx application is available.

Own Id: OTP-8300

Dialyzer 2.0.0

Improvements and New Features

There is a major addition to the capabilities of dialyzer, worthy of bumping the version number. Starting with this version, dialyzer not only accepts but also properly processes remote types (i.e., types of the form ModuleName:TypeName()). Previous dialyzer versions only accepted this notation in -type and -spec declarations, but effectively ignored its information by mapping remote types to the type any(). In contrast, starting with this version, remote types are used in the analysis and are also stored in the PLTs. (This addition changes the format of PLTs and requires rebuilding any PLTs created by an older dialyzer version.) Note that dialyzer will complain and abort the analysis of a set of modules if it needs to process a remote type without a definition (either because the module does not include a definition of the type or the module is not included in the analysis). We may relax this restriction in a future version.

Fixed minor issue with dialyzer:run/1 crashing (upon its return) when used for adding type information to an existing PLT.

Fixed minor but quite annoying issues in dialyzer's GUI.

Own Id: OTP-8187

Dialyzer 1.9.2

Improvements and New Features

Fixed problem with type inference going into an infinite loop when analyzing a strongly connected component of functions that do not return but also contain an erroneous call which makes them fail and be assigned the type none() instead of the type unit().

More accurate type information for some BIFs and library files.

Introduced boolean() as the `official' name for the type was so far known as bool(). The latter is still accepted as well as boolean().

Own Id: OTP-8037

Dialyzer 1.9.1

Improvements and New Features

Has better handling of opaque types.

The handling of UTF segments of bitstreams has been significantly strengthened and revised. In all probability, now it is correct.

Own Id: OTP-7958

Dialyzer 1.9.0

Improvements and New Features

The analysis accepts opaque type declarations and detects violations of opacity of terms of such types. Starting with R13, many Erlang/OTP standard libraries (array, dict, digraph, ets, gb_sets, gb_trees, queue, and sets) contain opaque type declarations of their main data types. Dialyzer will spit out warnings in code that explicitly depends on the structure of these terms.

Added support for handling UTF segments in bitstreams and for detecting obvious type errors in these segments. Warning: This code is not terribly tested though since there are very few Erlang programs which use Unicode-based binaries - not surprising since this is a new language feature of R13.

Strengthened the discrepancy identification when testing for equality and matching between terms of different types. This detects more bugs in code.

Added warning for M:F(...) calls where M is not a module term and F is not an atom. Previously, such calls where found to fail but the reason for the failure was not reported.

Added a convenient shorthand for the --no_check_plt option (-n).

Added the --dump_callgraph option for dumping the callgraph of all files that are analyzed into a specified file. The callgraph either be dumped in raw format, in .dot format, or converted to a .ps (postscript) file. Note that in large callgraphs the generated postscript file might not be interpretable by Ghostview. (Thanks to Ilya Khlopotov for the initial version of this functionality.)

Own Id: OTP-7864

Dialyzer 1.8.3

Improvements and New Features

Added the --no_check_plt option that makes the startup time faster when working with stable PLTs that do not change.

Changed the phrasing of some warnings so that they do not cause confusion to some users and correspond better to reality.

Own Id: OTP-7632

Dialyzer 1.8.2

Improvements and New Features

Minor updates.

Own Id: OTP-7522

Dialyzer 1.8.1

Improvements and New Features

There is new --raw option for Dialyzer to output the result of the analysis in Erlang term, to facilitate later filtering and/or formatting.

Own Id: OTP-7386

The return type of the Erlang interface dialyzer:run/1 has changed to only return a list of warnings. If something goes wrong dialyzer dies with an exception.

The handling of the PLT is now more flexible. There is no longer any default PLT included with OTP. Please consult the manual for the changes.

Own Id: OTP-7389

Dialyzer 1.8.0

Improvements and New Features

Dialyzer's analysis is from now on exclusively based on success typings. In particular, support for options --old_style and --dataflow has been discontinued.

Better and more aggressive handling of type information in records.

Dialyzer has a new warning option -Wunmatched_returns which warns for function calls that ignore the return value. This catches many common programming errors (e.g. calling file:close/1 and not checking for the absence of errors), interface discrepancies (e.g. a function returning multiple values when in reality the function is void and only called for its side-effects), calling the wrong function (e.g. io_lib:format/1 instead of io:format/1), and even possible performance defects (e.g. unnecessarily constructing a list using a list comprehension instead of using lists:foreach/2). Whenever a function returns a single atomic value (e.g. 'ok' or pid()), the warning is suppressed. This allows for "void" functions (returning a single atom like 'ok') or for calls to certain builtins like spawn. Because not all calls which ignore the return value are discrepancies, the option is off by default and has to be explicitly requested by the user. But we recommend it nevertheless.

Some warning options (-Wno_comp, -Wno_guards, -Wno_unsafe_beam, etc.) which could be used when analyzing bytecode produced by an old BEAM compiler have been removed.

Own Id: OTP-7241

Dialyzer 1.7.2

Improvements and New Features

The warnings returned by the Erlang interface now contains a tag describing the type of warning.

* POTENTIAL INCOMPATIBILITY *

Own Id: OTP-7134

Dialyzer 1.7.1

Improvements and New Features

Use of success typings is now default, is robust and detects significantly more errors than in previous versions.

Dialyzer now accepts and takes into account type information in record declarations and in contracts -- see related paper in Erlang'07 workshop. Various OTP applications (e.g. stdlib and kernel) are partially annotated with appropriate contracts specifying types information for their functions.

The type previously known as unit() has been renamed to no_return(). Its use in a contract as the return type of a function now silences off the "function has no local return" dialyzer warning without use of the corresponding option.

Own Id: OTP-6997

Dialyzer 1.7.0

Improvements and New Features

Minor Makefile changes.

Own Id: OTP-6689

Dialyzer can now use success typings to find discrepancies. As a consequence significantly more discrepancies are detected. The downside is that the analysis takes about 2 to 2.5 times longer than in previous versions, and may also result in some warnings that might be harder to interpret even though they are correct. This has been a major change, worth of increasing the version number.

New command-line options:

--succ_typings Use the success typings analysis.

--dataflow (default) Use the previous analysis.

The new type unit() has been introduced to handle the return type of non-terminating functions such as servers.

Dialyzer's code server uses a compressed representation and the analysis requires significantly less memory than in previous versions.

Own Id: OTP-6736

Dialyzer 1.6.0

Improvements and New Features

Dialyzer (in the modes where either source or BEAM code which contains debug_info is analyzed) spits out line information for all discrepancies. This has been a major change, worth of increasing the version number.

We warn users that considerably more discrepancies are identified by this version of Dialyzer compared with previous ones and applications. If, for some reason, warnings generated by previous versions of Dialyzer are preferable, the command line option --old_style can be employed.

Own Id: OTP-6546

Dialyzer handles term comparison operators more precisely and is able to identify more discrepancies in 'if' or 'case' statements with comparisons.

Dialyzer has more precise type information for many standard OTP functions.

Own Id: OTP-6547

Dialyzer 1.5.1

Improvements and New Features

Updated the chapter "More on the Persistent Lookup Table (PLT)" in Dialyzer User's Guide and added information on how to use Dialyzer from Erlang to dialyzer. Also, the Dialyzer text files used by its GUI are now included in the Erlang/OTP release.

Own Id: OTP-6361

New options --check_init_plt and --verbose.

Improvements in the analysis (meaning that this version can find more discrepancies than the previous version).

Own Id: OTP-6421

Dialyzer 1.5.0

Improvements and New Features

Dialyzer's building of PLT is based on a different type inference algorithm. More specifically, Dialyzer uses inference of refined success typings to infer function prototypes. As a result, Dialyzer bases its analysis on a significantly more powerful basis and thus is able to detect more discrepancies. The downside is that building the PLT is a considerably slower process. We will work on improving that.

Dialyzer takes into account the BEAM compiler directive -compile({nowarn_unused_function, {F,A}}). and then suppresses the warning that function F/A will never be called.

Dialyzer's default initial PLT now also includes "mnesia".

Own Id: OTP-6304

Dialyzer 1.4.2

Improvements and New Features

Improvements in PLT management.

Own Id: OTP-6128

Dialyzer 1.4.1

Fixed Bugs and Malfunctions

Some minor changes.

Improvements and New Features

Some minor changes.

Dialyzer 1.4.0

Fixed Bugs and Malfunctions

Changes for Dialyzer to work with Erlang/OTP R10B-10.

Improvements and New Features

Dialyzer's analysis is significantly faster as it uses a global function call-graph for obtaining type signatures for all analyzed functions.

Dialyzer 1.3.1

Fixed Bugs and Malfunctions

Small changes for Dialyzer to work with Erlang/OTP R10B-5.

Fixed a small buglet in the analysis; this affected one of HiPE's files.

Improvements and New Features

Modified setup script for execution under Cygwin (patch by Vlad Dumitrescu).

Added command line option --no_warn_on_inline.

Dialyzer now explicitly warns when modules with the same name but from different dirs are being analyzed (contribution by Ulf Wiger).

Dialyzer 1.3.0

Fixed Bugs and Malfunctions

Fixed a number of false positives that Dialyzer 1.2.0 was spitting out.

Improvements and New Features

Requires the presence of an Erlang/OTP R10B-4 system.

Dialyzer is significantly (approx 40%) faster since it now uses 'ets' rather than 'dets' for its PLT.

Slightly improved the precision of the analysis.

In the GUI version, Dialyzer now reports the list of modules that should be included in the modules to analyze in order to possibly improve the accuracy of the reported results.

Some more information is displayed when calling a function or closure with arguments of the wrong type.

The record guard now allows discrepancies involving tuples that are known to be records to be displayed as #rec{} rather than {'rec',,...,}

Added -q option which makes the command-line version of Dialyzer a bit more silent.

Dialyzer 1.2.0

Improvements and New Features

Dialyzer works with the open source and commercial versions of Erlang/OTP R10B-2 on all platforms (i.e., HiPE support is not a prerequisite anymore).

Whenever a .beam file contains abstract code (i.e., has been compiled with the +debug_info option), the analysis starts from this code rather than from BEAM bytecode -- this makes the results identical to those obtained by analysis starting from source code. (This is a contribution from Bjorn Gustavsson - Thanks!)

Added -pa command line option for easier handling of -include_lib() directives in source code.

Includes all changes added in v1.1.1; see below. The "Add Recursively" functionality is also available in the command-line mode (-r option).

Dialyzer 1.1.1

Fixed Bugs and Malfunctions

Fixed problems using the shell script on Solaris machines.

Fixed small inconsistencies in Dialyzer's documentation and help.

Improvements and New Features

The command-line mode of Dialyzer spits discrepancies in stdout by default and returns a numeric value indicating its exit status.

Added "Add Recursively" button contributed by Martin Bjorklund (thanks!).

Dialyzer 1.1.0

Improvements and New Features

Dialyzer works with the open source version of Erlang/OTP R10B-1 (on platforms where HiPE support is available) and it does not require installation of a customized Erlang/OTP system anymore.

Dialyzer comes with an extensive command-line interface, in addition to an enhanced GUI.

Analysis can start from source code (through Core Erlang) as well as from BEAM bytecode.

Dialyzer finds considerably more discrepancies in Erlang code than previous versions.

Added ability to selectively turn on/off different warning categories.

Dialyzer 1.0.1

Fixed Bugs and Malfunctions

Fixed major bug of v1.0.0 which caused the analysis to stop prematurely (i.e., without properly reaching fixpoint) when analyzing more than one module. This did not affect correctness of the results, but lost many opportunities to detect discrepancies.

Improvements and New Features

Performance improvements in the analysis.

Dialyzer 1.0.0

Improvements and New Features

Initial Dialyzer version: Analysis starts from BEAM bytecode only and only a GUI version is available. Dialyzer reports discrepancies in the use of the "sequential" part of Erlang. To be used, Dialyzer requires the presence of a specific snapshot of Erlang/OTP which can be obtained from Dialyzer's homepage.

Dialyzer

Introduction

Scope

Dialyzer is a static analysis tool that identifies software discrepancies, such as definite type errors, code that is unreachable because of programming error, and unnecessary tests in single Erlang modules or an entire codebase.

Dialyzer can be called from the command line and from Erlang.

The Persistent Lookup Table

Dialyzer stores the result of an analysis in a Persistent Lookup Table (PLT). The PLT can then be used as a starting point for later analyses. It is recommended to build a PLT with the Erlang/OTP applications that you are using, but also to include your own applications that you are using frequently.

The PLT is built using option --build_plt to Dialyzer. The following command builds the recommended minimal PLT for Erlang/OTP:

dialyzer --build_plt --apps erts kernel stdlib mnesia

Dialyzer looks if there is an environment variable called DIALYZER_PLT and places the PLT at this location. If no such variable is set, Dialyzer places the PLT in a file called .dialyzer_plt in the filename:basedir(user_cache, "erlang") folder. The placement can also be specified using the options --plt or --output_plt.

Information can be added to an existing PLT using option --add_to_plt. If you also want to include the Erlang compiler in the PLT and place it in a new PLT, then use the following command:

dialyzer --add_to_plt --apps compiler --output_plt my.plt

Then you can add your favorite application my_app to the new PLT:

dialyzer --add_to_plt --plt my.plt -r my_app/ebin

But you realize that it is unnecessary to have the Erlang compiler in this one:

dialyzer --remove_from_plt --plt my.plt --apps compiler

Later, when you have fixed a bug in your application my_app, you want to update the PLT so that it becomes fresh the next time you run Dialyzer. In this case, run the following command:

dialyzer --check_plt --plt my.plt

Dialyzer then reanalyzes the changed files and the files that depend on these files. Note that this consistency check is performed automatically the next time you run Dialyzer with this PLT. Use option --check_plt to perform the consistency check without doing any other analysis.

To get information about a PLT, use the following option:

dialyzer --plt_info

To specify which PLT, use option --plt.

To get the output printed to a file, use option --output_file.

Note that no warnings are emitted when manipulating the PLT. To turn on warnings during (re)analysis of the PLT, use option --get_warnings.

Using Dialyzer from the Command Line

Dialyzer has a command-line version for automated use. See dialyzer.

Using Dialyzer from Erlang

Dialyzer can also be used directly from Erlang. See dialyzer.

Dialyzer's Model of Analysis

Dialyzer operates somewhere between a classical type checker and a more general static-analysis tool: It checks and consumes function specs, yet does not require them, and it can find bugs across modules which consider the dataflow of the programs under analysis. This means Dialyzer can find genuine bugs in complex code, and is pragmatic in the face of missing specs or limited information about the codebase, only reporting issues which it can prove have the potential to cause a genuine issue at runtime. This means Dialyzer will sometimes not report every bug, since it cannot always find this proof.

How Dialyzer Uses Function Specifications

Dialyzer infers types for all top-level functions in a module. If the module also has a spec given in the source-code, Dialyzer will compare the inferred type to the spec. The comparison checks, for each argument and the return, that the inferred and specified types overlap — which is to say, the types have at least one possible runtime value in common. Notice that Dialyzer does not check that one type contains a subset of values of the other, or that they are precisely equal: This allows Dialyzer to make simplifying assumptions to preserve performance and avoid reporting program flows which could potentially succeed at runtime.

If the inferred and specified types do not overlap, Dialyzer will warn that the spec is invalid with respect to the implementation. However, if they do overlap, Dialyzer will proceed under the assumption that the correct type for the given function is the intersection of the inferred type and the specified type (the rationale being that the user may know something that Dialyzer itself cannot deduce). One implication of this is that if the user gives a spec for a function which overlaps with Dialyzer's inferred type, but is more restrictive, Dialyzer will trust those restrictions. This may then generate an error elsewhere that follows from the erroneously restricted spec.

Examples:

Non-overlapping argument:

-spec foo(boolean()) -> string().
%% Dialyzer will infer: foo(integer()) -> string().
foo(N) ->
    integer_to_list(N).

Since the type of the argument in the spec is different from the type that Dialyzer inferred, Dialyzer will generate the following warning:

some_module.erl:7:2: Invalid type specification for function some_module:foo/1.
 The success typing is some_module:foo
          (integer()) -> string()
 But the spec is some_module:foo
          (boolean()) -> string()
 They do not overlap in the 1st argument

Non-overlapping return:

-spec bar(a | b) -> atom().
%% Dialyzer will infer: bar(a | b) -> binary().
bar(a) -> <<"a">>;
bar(b) -> <<"b">>.

Since the return value in the spec and the return value inferred by Dialyzer are different, Dialyzer will generate the following warning:

some_module.erl:11:2: Invalid type specification for function some_module:bar/1.
 The success typing is some_module:bar
          ('a' | 'b') -> <<_:8>>
 But the spec is some_module:bar
          ('a' | 'b') -> atom()
 The return types do not overlap

Overlapping spec and inferred type:

-spec baz(a | b) -> non_neg_integer().
%% Dialyzer will infer: baz(b | c | d) -> -1 | 0 | 1.
baz(b) -> -1;
baz(c) -> 0;
baz(d) -> 1.

Dialyzer will "trust" the spec and using the intersection of the spec and inferred type:

baz(b) -> 0 | 1.

Notice how the c and d from the argument to baz/1 and the -1 in the return from the inferred type were dropped once the spec and inferred type were intersected. This could result in warnings being emitted for later functions.

For example, if baz/1 is called like this:

call_baz1(A) ->
    case baz(A) of
        -1 -> negative;
        0 -> zero;
        1 -> positive
    end.

Dialyzer will generate the following warning:

some_module.erl:25:9: The pattern
          -1 can never match the type
          0 | 1

If baz/1 is called like this:

call_baz2() ->
    baz(a).

Dialyzer will generate the following warnings:

some_module.erl:30:1: Function call_baz2/0 has no local return
some_module.erl:31:9: The call t:baz
         ('a') will never return since it differs in the 1st argument
               from the success typing arguments:
         ('b' | 'c' | 'd')

Feedback and Bug Reports

We very much welcome user feedback! If you notice anything weird, especially if Dialyzer reports any discrepancy that is a false positive, please open an issue describing the symptoms and how to reproduce them.

typer

Type annotator for Erlang programs.

Description

TypEr shows type information for Erlang modules. Additionally, it can annotate the code of files with such type information.

Using TypEr

TypEr is used from the command-line. This section provides a brief description of the options. The same information can be obtained by writing the following in a shell:

typer --help

Usage:

typer [--help] [--version] [--plt PLT] [--edoc]
      [--show | --show-exported | --annotate | --annotate-inc-files | --annotate-in-place]
      [-Ddefine]* [-I include_dir]* [-pa dir]* [-pz dir]*
      [-T application]* file* [-r directory*]

Note

* denotes that multiple occurrences of the option are possible.

Options:

-r - Search directories recursively for .erl files below them. If a list of files is given, this option must given be after them.

--show - Print type specifications for all functions on stdout. (This is the default behaviour; this option is not really needed.)

--show-exported (or show_exported) - Same as --show, but print specifications for exported functions only. Specs are displayed sorted alphabetically according to the function's name.

--annotate - Annotate the specified files with type specifications.

--annotate-inc-files - Same as --annotate, but annotates all -include() files as well as all .erl files. (Use this option with caution — it is not well-tested.)

--annotate-in-place - Annotate directly in the source code files, instead of dumping the annotated files in a different directory. (Use this option with caution — it is not well-tested.)

--edoc - Print type information as Edoc @spec comments, not as type specs.

--plt - Use the specified dialyzer PLT file rather than the default one.

-T file* - The specified file(s) already contain type specifications and these are to be trusted in order to print specs for the rest of the files. (Multiple files or directories, separated by spaces, can be specified.)

-Dname (or -Dname=value) - Pass the defined name(s) to TypEr. (**)

-I - Pass the include_dir to TypEr. (**)

-pa dir - Include dir in the path for Erlang. This is useful when analyzing files that use -include_lib() directives or parse transforms.

-pz dir - Include dir in the path for Erlang. This is useful when analyzing files that use -include_lib() directives or parse transforms.

--version (or -v) - Print the TypEr version and some more information and exit.

Note

** options -D and -I work the same way as in erlc.

dialyzer

Dialyzer is a DIscrepancy AnaLYZer for ERlang programs.

Dialyzer is a static analysis tool that identifies software discrepancies, such as definite type errors, code that is unreachable because of programming errors, and unnecessary tests in single Erlang modules or an entire codebase.

Dialyzer starts its analysis from either debug-compiled BEAM code or from Erlang source code. The file and line number of a discrepancy is reported along with an indication of the nature of the discrepancy. Dialyzer bases its analysis on the concept of success typings, ensuring sound warnings without false positives.

Using Dialyzer from the Command Line

This section provides a brief description of the options available when running Dialyzer from the command line. The same information can be obtained by writing the following in a shell:

dialyzer --help

Exit status of the command-line version:

0 - No problems were found during the analysis and no warnings were emitted.

1 - Problems were found during the analysis.

2 - No problems were found during the analysis, but warnings were emitted.

Usage:

dialyzer [--add_to_plt] [--apps applications] [--build_plt]
         [--check_plt] [-Ddefine]* [-Dname]* [--dump_callgraph file]
         [--error_location flag] [files_or_dirs] [--fullpath]
         [--get_warnings] [--help] [-I include_dir]*
         [--incremental] [--metrics_file] [--no_check_plt] [--no_indentation]
         [--no_spec] [-o outfile] [--output_plt file] [-pa dir]* [--plt plt]
         [--plt_info] [--plts plt*] [--quiet] [-r dirs] [--raw]
         [--remove_from_plt] [--shell] [--src] [--statistics] [--verbose]
         [--version] [--warning_apps applications] [-Wwarn]*

Note

* denotes that multiple occurrences of the option are possible.

Options of the command-line version:

--add_to_plt - The PLT is extended to also include the files specified with -c and -r. Use --plt to specify which PLT to start from, and --output_plt to specify where to put the PLT. Note that files already included in the PLT will be reanalyzed if they depend on the new files. This option only works for BEAM files, not source files.

--apps applications - By default, warnings will be reported to all applications given by --apps. However, if --warning_apps is used, only those applications given to --warning_apps will have warnings reported. All applications given by --apps, but not --warning_apps, will be analysed to provide context to the analysis, but warnings will not be reported for them. For example, you may want to include libraries you depend on in the analysis with --apps so discrepancies in their usage can be found, but only include your own code with --warning_apps so that discrepancies are only reported in code that you own.

--warning_apps applications - This option is typically used when building or modifying a PLT as in:

dialyzer --build_plt --apps erts kernel stdlib mnesia ...

to refer conveniently to library applications corresponding to the Erlang/OTP installation. This option can also be used during analysis to refer to Erlang/OTP applications. File or directory names can also be included, as in:

dialyzer --apps inets ssl ./ebin ../other_lib/ebin/my_module.beam

--build_plt - The analysis starts from an empty PLT and creates a new one from the files specified with -c and -r. This option only works for BEAM files. To override the default PLT location, use --plt or --output_plt.

--check_plt - Check the PLT for consistency and rebuild it if it is not up-to-date.

-Dname (or -Dname=value) - When analyzing from source, pass the define to Dialyzer. (**)

--dump_callgraph file - Dump the call graph into the specified file whose format is determined by the filename extension. Supported extensions are: raw, dot, and ps. If something else is used as filename extension, the default .raw format is used.

--error_location column | line - Use a pair {Line, Column} or an integer Line to pinpoint the location of warnings. The default is to use a pair {Line, Column}. When formatted, the line and the column are separated by a colon.

files_or_dirs (for backward compatibility also as -c files_or_dirs) - Use Dialyzer from the command line to detect defects in the specified files or directories containing .erl or .beam files, depending on the type of the analysis.

--fullpath - Display the full path names of files for which warnings are emitted.

--get_warnings - Make Dialyzer emit warnings even when manipulating the PLT. Warnings are only emitted for files that are analyzed.

--help (or -h) - Print a help message and exit.

-I include_dir - When analyzing from source, pass the include_dir to Dialyzer. (**)

--input_list_file file - Analyze the file names that are listed in the specified file (one file name per line).

--no_check_plt - Skip the PLT check when running Dialyzer. This is useful when working with installed PLTs that never change.

--incremental - The analysis starts from an existing incremental PLT, or builds one from scratch if one does not exist, and runs the minimal amount of additional analysis to report all issues in the given set of apps. Notably, incremental PLT files are not compatible with "classic" PLT files, and vice versa. The initial incremental PLT will be updated unless an alternative output incremental PLT is given.

--no_indentation - Do not insert line breaks in types, contracts, and Erlang Code when formatting warnings.

--no_spec - Ignore functions specs. This is useful for debugging when one suspects that some specs are incorrect.

-o outfile (or --output outfile) - When using Dialyzer from the command line, send the analysis results to the specified outfile rather than to stdout.

--metrics_file file - Write metrics about Dialyzer's incrementality (for example, total number of modules considered, how many modules were changed since the PLT was last updated, how many modules needed to be analyzed) to a file. This can be useful for tracking and debugging Dialyzer's incrementality.

--output_plt file - Store the PLT at the specified file after building it.

-pa dir - Include dir in the path for Erlang. This is useful when analyzing files that have -include_lib() directives.

--plt plt - Use the specified PLT as the initial PLT. If the PLT was built during setup, the files are checked for consistency.

--plt_info - Make Dialyzer print information about the PLT and then quit. The PLT can be specified with --plt(s).

--plts plt* - Merge the specified PLTs to create the initial PLT. This requires that the PLTs are disjoint (that is, do not have any module appearing in more than one PLT). The PLTs are created in the usual way:

dialyzer --build_plt --output_plt plt_1 files_to_include
...
dialyzer --build_plt --output_plt plt_n files_to_include

They can then be used in either of the following ways:

dialyzer files_to_analyze --plts plt_1 ... plt_n

or

dialyzer --plts plt_1 ... plt_n -- files_to_analyze

Notice the -- delimiter in the second case.

--quiet (or -q) - Make Dialyzer a bit more quiet.

-r dirs - Same as files_or_dirs, but the specified directories are searched recursively for subdirectories containing .erl or .beam files in them, depending on the type of analysis.

--raw - When using Dialyzer from the command line, output the raw analysis results (Erlang terms) instead of the formatted result. The raw format is easier to post-process (for example, to filter warnings or to output HTML pages).

--remove_from_plt - The information from the files specified with -c and -r is removed from the PLT. Notice that this can cause a reanalysis of the remaining dependent files.

--src - Override the default, which is to analyze BEAM files, and analyze starting from Erlang source code instead.

--statistics - Print information about the progress of execution (analysis phases, time spent in each, and size of the relative input).

--verbose - Make Dialyzer a bit more verbose.

--version (or -v) - Print the Dialyzer version and some more information and exit.

-Wwarn - A family of options that selectively turn on/off warnings. (For help on the names of warnings, use dialyzer -Whelp.) Notice that the options can also be specified in the file with a -dialyzer() attribute. For details, see section Requesting or Suppressing Warnings in Source Files.

Note

** the syntax of defines and includes is the same as that used by erlc.

Warning options:

-Werror_handling (***) - Include warnings for functions that only return by an exception.

-Wextra_return (***) - Warn about functions whose specification includes types that the function cannot return.

-Wmissing_return (***) - Warn about functions that return values that are not part of the specification.

-Wno_behaviours - Suppress warnings about behavior callbacks that drift from the published recommended interfaces.

-Wno_contracts - Suppress warnings about invalid contracts.

-Wno_fail_call - Suppress warnings for failing calls.

-Wno_fun_app - Suppress warnings for fun applications that will fail.

-Wno_improper_lists - Suppress warnings for construction of improper lists.

-Wno_match - Suppress warnings for patterns that are unused or cannot match.

-Wno_missing_calls - Suppress warnings about calls to missing functions.

-Wno_opaque - Suppress warnings for violations of opacity of data types.

-Wno_return - Suppress warnings for functions that will never return a value.

-Wno_undefined_callbacks - Suppress warnings about behaviors that have no -callback attributes for their callbacks.

-Wno_unused - Suppress warnings for unused functions.

-Wno_unknown - Suppress warnings about unknown functions and types. The default is to warn about unknown functions and types when setting the exit status. When using Dialyzer from Erlang, warnings about unknown functions and types are returned.

-Wunderspecs (***) - Warn about underspecified functions (the specification is strictly more allowing than the success typing).

-Wunmatched_returns (***) - Include warnings for function calls that ignore a structured return value or do not match against one of many possible return values. However, no warnings are included if the possible return values are a union of atoms or a union of numbers.

The following options are also available, but their use is not recommended (they are mostly for Dialyzer developers and internal debugging):

-Woverspecs (***) - Warn about overspecified functions (the specification is strictly less allowing than the success typing).

-Wspecdiffs (***) - Warn when the specification is different than the success typing.

Note

*** denotes options that turn on warnings rather than turning them off.

The following options are not strictly needed as they specify the default. They are primarily intended to be used with the -dialyzer attribute. For an example see section Requesting or Suppressing Warnings in Source Files.

-Wno_underspecs - Suppress warnings about underspecified functions (the specification is strictly more allowing than the success typing).

-Wno_extra_return - Suppress warnings about functions whose specification includes types that the function cannot return.

-Wno_missing_return - Suppress warnings about functions that return values that are not part of the specification.

Using Dialyzer from Erlang

Dialyzer can be used directly from Erlang. The options are similar to the ones given from the command line. See section Using Dialyzer from the Command Line.

Default Dialyzer Options

The (host operating system) environment variable ERL_COMPILER_OPTIONS can be used to give default Dialyzer options. Its value must be a valid Erlang term. If the value is a list, it is used as is. If it is not a list, it is put into a list.

The list is appended to any options given to run/1 or on the command line.

The list can be retrieved with compile:env_compiler_options/0.

Currently the only option used is the error_location option.

Dialyzer configuration file:

Dialyzer's configuration file may also be used to augment the default options and those given directly to the Dialyzer command. It is commonly used to avoid repeating options which would otherwise need to be given explicitly to Dialyzer on every invocation.

The location of the configuration file can be set via the DIALYZER_CONFIG environment variable, and defaults to within the user_config from filename:basedir/3.

An example configuration file's contents might be:

      {incremental,
        {default_apps,[stdlib,kernel,erts]},
        {default_warning_apps,[stdlib]}
      }.
      {warnings, [no_improper_lists]}.
      {add_pathsa,["/users/samwise/potatoes/ebin"]}.
      {add_pathsz,["/users/smeagol/fish/ebin"]}.

Requesting or Suppressing Warnings in Source Files

Attribute -dialyzer() can be used for turning off warnings in a module by specifying functions or warning options. For example, to turn off all warnings for the function f/0, include the following line:

-dialyzer({nowarn_function, f/0}).

To turn off warnings for improper lists, add the following line to the source file:

-dialyzer(no_improper_lists).

Attribute -dialyzer() is allowed after function declarations. Lists of warning options or functions are allowed:

-dialyzer([{nowarn_function, [f/0]}, no_improper_lists]).

Warning options can be restricted to functions:

-dialyzer({no_improper_lists, g/0}).

-dialyzer({[no_return, no_match], [g/0, h/0]}).

The warning option for underspecified functions, -Wunderspecs, can result in useful warnings, but often functions with specifications that are strictly more allowing than the success typing cannot easily be modified to be less allowing. To turn off the warning for underspecified function f/0, include the following line:

-dialyzer({no_underspecs, f/0}).

For help on the warning options, use dialyzer -Whelp. The options are also enumerated, see type warn_option/0.

Attribute -dialyzer() can also be used for turning on warnings. For example, if a module has been fixed regarding unmatched returns, adding the following line can help in assuring that no new unmatched return warnings are introduced:

-dialyzer(unmatched_returns).

Summary

Types

dial_option()

Option from defaults to byte_code. Options init_plt and plts change the default.

dial_warn_tag()

dial_warning()

error_location()

If the value of this option is line, an integer Line is used as Location in messages. If the value is column, a pair {Line, Column} is used as Location. The default is column.

file_location()

filename_opt()

format_option()

warn_option()

See section Warning options for a description of the warning options.

Functions

format_warning(Warnings)

Get a string from warnings as returned by run/1.

format_warning(Warnings, Options)

Get a string from warnings as returned by run/1.

plt_info(Plt)

Returns information about the specified PLT.

run(Options)

Run Dialyzer and return warnings.

Types

dial_option()

(not exported)

-type dial_option() ::
          {files, [FileName :: file:filename()]} |
          {files_rec, [DirName :: file:filename()]} |
          {defines, [{Macro :: atom(), Value :: term()}]} |
          {from, src_code | byte_code} |
          {init_plt, FileName :: file:filename()} |
          {plts, [FileName :: file:filename()]} |
          {include_dirs, [DirName :: file:filename()]} |
          {output_file, FileName :: file:filename()} |
          {metrics_file, FileName :: file:filename()} |
          {module_lookup_file, FileName :: file:filename()} |
          {output_plt, FileName :: file:filename()} |
          {check_plt, boolean()} |
          {analysis_type, succ_typings | plt_add | plt_build | plt_check | plt_remove | incremental} |
          {warnings, [warn_option()]} |
          {get_warnings, boolean()} |
          {use_spec, boolean()} |
          {filename_opt, filename_opt()} |
          {callgraph_file, file:filename()} |
          {mod_deps_file, file:filename()} |
          {warning_files_rec, [DirName :: file:filename()]} |
          {error_location, error_location()}.

Option from defaults to byte_code. Options init_plt and plts change the default.

dial_warn_tag()

(not exported)

-type dial_warn_tag() ::
          warn_behaviour | warn_bin_construction | warn_callgraph | warn_contract_extra_return |
          warn_contract_missing_return | warn_contract_not_equal | warn_contract_opaque |
          warn_contract_range | warn_contract_subtype | warn_contract_supertype | warn_contract_syntax |
          warn_contract_types | warn_failing_call | warn_fun_app | warn_map_construction |
          warn_matching | warn_non_proper_list | warn_not_called | warn_opaque |
          warn_overlapping_contract | warn_return_no_exit | warn_return_only_exit |
          warn_undefined_callbacks | warn_unknown | warn_umatched_return.

dial_warning()

(not exported)

-type dial_warning() :: {Tag :: dial_warn_tag(), Id :: file_location(), Msg :: {atom(), [term()]}}.

error_location()

(not exported)

-type error_location() :: column | line.

If the value of this option is line, an integer Line is used as Location in messages. If the value is column, a pair {Line, Column} is used as Location. The default is column.

file_location()

(not exported)

-type file_location() :: {File :: file:filename(), Location :: erl_anno:location()}.

filename_opt()

(not exported)

-type filename_opt() :: basename | fullpath.

format_option()

(not exported)

-type format_option() ::
          {indent_opt, boolean()} | {filename_opt, filename_opt()} | {error_location, error_location()}.

warn_option()

(not exported)

-type warn_option() ::
          error_handling | no_behaviours | no_contracts | no_fail_call | no_fun_app |
          no_improper_lists | no_match | no_missing_calls | no_opaque | no_return |
          no_undefined_callbacks | no_underspecs | no_unknown | no_unused | underspecs | unknown |
          unmatched_returns | overspecs | specdiffs | overlapping_contract | extra_return |
          no_extra_return | missing_return | no_missing_return | opaque_union.

See section Warning options for a description of the warning options.

Functions

format_warning(Warnings)

-spec format_warning(Warnings) -> string() when Warnings :: dial_warning().

Get a string from warnings as returned by run/1.

format_warning(Warnings, Options)

(since R14B02)

-spec format_warning(Warnings, Options) -> string()
                        when Warnings :: dial_warning(), Options :: filename_opt() | [format_option()].

Get a string from warnings as returned by run/1.

If indent_opt is set to true (default), line breaks are inserted in types, contracts, and Erlang code to improve readability.

If error_location is set to column (default), locations are formatted as Line:Column if the column number is available, otherwise locations are formatted as Line even if the column number is available.

plt_info(Plt)

-spec plt_info(Plt) -> {ok, ClassicResult | IncrementalResult} | {error, Reason}
                  when
                      Plt :: file:filename(),
                      ClassicResult :: [{files, [file:filename()]}],
                      IncrementalResult :: {incremental, [{modules, [module()]}]},
                      Reason :: not_valid | no_such_file | read_error.

Returns information about the specified PLT.

run(Options)

-spec run(Options) -> Warnings when Options :: [dial_option()], Warnings :: [dial_warning()].

Run Dialyzer and return warnings.