eunit

v2.11-rc0

EUnit Release Notes

This document describes the changes made to the EUnit application.

Eunit 2.11

Improvements and New Features

Added randomDelay macro.

Own Id: OTP-19997 Aux Id: PR-10614

Added support for -unsafe attributes, which is used to mark functions as unsafe to use.

This is similar to but separate from deprecation, and the compiler will by default now generate warnings for calls to functions in Erlang/OTP that are known to be always unsafe.

Furthermore, xref can now be used to find calls to functions in another application that lack a -doc attribute (undocumented_function_calls), calls to functions in another application marked -doc false. (private_function_calls), as well as calls to unsafe functions (unsafe_function_calls).

Own Id: OTP-20066 Aux Id: PR-10839

Eunit 2.10.3

Fixed Bugs and Malfunctions

Fixed EUnit {node, ...} instantiation by passing node name (instead of pid) and restored net_kernel auto-start for non-distributed nodes.

Own Id: OTP-20047 Aux Id: PR-10788

Eunit 2.10.2

Improvements and New Features

Release applications, tests, and documentation are now placed in their respective directories. Source SBOM with more packages.

A make release application places only the necessary code in the release folder. The main change is that the documentation and examples are not part of the release folder anymore.

make release_docs places the documentation in the released code under the doc folder.

make release_tests places the tests in their own directory. It used to be the case that some source code was mixed with the tests, and this should not happen anymore.

The Software Bill of Materials places the examples folders as if they are part of the SPDX-otp-<app>-doc packge, instead of placing examples as if they were running source code.

Overall, this change cleans up many things that were not quite correct by definition, and everything should still continue to work as expected. To test a release, one can still run ./Install -minimal \pwd`and add the release to thePATH. After that, one can run tests as usual, going into the released tests directory, enteringtest_server` and running the emulator.

Improves the source Software-Bill-of-Materials

The improvements adds new SPDX relations for asmjit and zlib to be optional_components_of the Erlang/OTP project.

The autoconf scripts in make and erts have now been categorised as build_tool_of the Erlang/OTP project.

All remaining configure, configure.ac, config.h.in, Makefile.in, Makefile.src, EMakefile, and GNUMakefile are now part of a specific SPDX package with relation build_tool_of the Erlang/OTP project.

Own Id: OTP-19886 Aux Id: PR-10434

Eunit 2.10.1

Improvements and New Features

The usages of deprecated slave module have been removed from the application. The fixture clause for spawning a test node now accepts Args either as a string or a list of strings (previously only a string was accepted).

Own Id: OTP-19738 Aux Id: PR-10128

Eunit 2.10

Fixed Bugs and Malfunctions

Fix so that when running tests in parallel and one test is cancelled due to a failing setup, it is report as cancelled. Before this fix the cancellation was ignored.

Own Id: OTP-19630 Aux Id: PR-9794

Improvements and New Features

EEP-69: Nominal Types has been implemented. As a side effect, nominal types can encode opaque types. We changed all opaque-handling logic and improved opaque warnings in Dialyzer.

All existing Erlang type systems are structural: two types are seen as equivalent if their structures are the same. Type comparisons are based on the structures of the types, not on how the user explicitly defines them. For example, in the following example, meter() and foot() are equivalent. The two types can be used interchangeably. Neither of them differ from the basic type integer().

-type meter() :: integer().
-type foot() :: integer().

Nominal typing is an alternative type system, where two types are equivalent if and only if they are declared with the same type name. The EEP proposes one new syntax -nominal for declaring nominal types. Under nominal typing, meter() and foot() are no longer compatible. Whenever a function expects type meter(), passing in type foot() would result in a Dialyzer error.

-nominal meter() :: integer().
-nominal foot() :: integer().

More nominal type-checking rules can be found in the EEP. It is worth noting that most work for adding nominal types and type-checking is in erl_types.erl. The rest are changes that removed the previous opaque type-checking, and added an improved version of it using nominal type-checking with reworked warnings.

Backwards compatibility for opaque type-checking is not preserved by this PR. Previous opaque warnings can appear with slightly different wordings. A new kind of opaque warning opaque_union is added, together with a Dialyzer option no_opaque_union to turn this kind of warnings off.

Own Id: OTP-19364 Aux Id: PR-9079

Fixed licenses in files and added ORT curations to the following apps: otp, eldap, erl_interface, eunit, parsetools, stdlib, syntax_tools, and ERTS.

Own Id: OTP-19478 Aux Id: PR-9376, PR-9402, PR-9819

The license and copyright header has changed format to include an SPDX-License-Identifier. At the same time, most files have been updated to follow a uniform standard for license headers.

Own Id: OTP-19575 Aux Id: PR-9670

Eunit 2.9.1

Improvements and New Features

The documentation has been migrated to use Markdown and ExDoc.

Own Id: OTP-18955 Aux Id: PR-8026

Eunit 2.9

Improvements and New Features

With this change, EUnit timetraps can be scaled with the use of scale_timeouts option.

Own Id: OTP-18771 Aux Id: PR-7635

Eunit 2.8.2

Improvements and New Features

Replace size/1 with either tuple_size/1 or byte_size/1

The size/1 BIF is not optimized by the JIT, and its use can result in worse types for Dialyzer.

When one knows that the value being tested must be a tuple, tuple_size/1 should always be preferred.

When one knows that the value being tested must be a binary, byte_size/1 should be preferred. However, byte_size/1 also accepts a bitstring (rounding up size to a whole number of bytes), so one must make sure that the call to byte_size/ is preceded by a call to is_binary/1 to ensure that bitstrings are rejected. Note that the compiler removes redundant calls to is_binary/1, so if one is not sure whether previous code had made sure that the argument is a binary, it does not harm to add an is_binary/1 test immediately before the call to byte_size/1.

Own Id: OTP-18432 Aux Id: GH-6672,PR-6793,PR-6784,PR-6787,PR-6785,PR-6682,PR-6800,PR-6797,PR-6798,PR-6799,PR-6796,PR-6813,PR-6671,PR-6673,PR-6684,PR-6694,GH-6677,PR-6696,PR-6670,PR-6674

Eunit 2.8.1

Fixed Bugs and Malfunctions

With this change, eunit exact_execution option works with application primitive.

Own Id: OTP-18264 Aux Id: PR-6322, GH-6320

Eunit 2.8

Improvements and New Features

With this change, Eunit can optionally not try to execute related module with "_tests" suffix. This might be used for avoiding duplicated executions when source and test modules are located in the same folder.

Own Id: OTP-18181 Aux Id: ERL-97, GH-3064, PR-5461

Eunit 2.7.1

Improvements and New Features

Minor internal improvements.

Own Id: OTP-17884 Aux Id: GH-5617

Eunit 2.7

Improvements and New Features

In an eunit test, when a test case times out, include a stacktrace.

Own Id: OTP-17613 Aux Id: PR-5185

Eunit 2.6.1

Fixed Bugs and Malfunctions

The eunit_surefire report handler has been updated to automatically create the directories needed to store the surefire xml file.

Own Id: OTP-17300 Aux Id: PR-4695

Eunit 2.6

Improvements and New Features

Fixed compiler warning.

Own Id: OTP-16674

Eunit 2.5

Improvements and New Features

Let eunit_surefire skip invalid XML 1.0 characters.

Own Id: OTP-15950 Aux Id: PR-2316, ERL-991

Add new macro ?capturedOutput for enabling to write test cases that verify data printed to standard out

Own Id: OTP-16275 Aux Id: PR-2424

Add option to limit print depth of exceptions generated by eunit test suites.

Own Id: OTP-16549 Aux Id: PR-2532

Eunit 2.4.1

Improvements and New Features

Backport of PR-2316: Strip control codes from eunit_surefire output to avoid generation of invalid xml

Own Id: OTP-16380 Aux Id: ERL-991, PR-2316, PR-2487

Eunit 2.4

Improvements and New Features

Remove compiler warnings from eunit.

Own Id: OTP-16313

Eunit 2.3.8

Fixed Bugs and Malfunctions

Handle get_until request with explicit encoding in the implementation of the I/O protocol.

Own Id: OTP-16000

Eunit 2.3.7

Fixed Bugs and Malfunctions

Improved documentation.

Own Id: OTP-15190

Eunit 2.3.6

Improvements and New Features

Calls to erlang:get_stacktrace() are removed.

Own Id: OTP-14861

Eunit 2.3.5

Fixed Bugs and Malfunctions

Removed all old unused files in the documentation.

Own Id: OTP-14475 Aux Id: ERL-409, PR-1493

Eunit 2.3.4

Improvements and New Features

Tools are updated to show Unicode atoms correctly.

Own Id: OTP-14464

Eunit 2.3.3

Fixed Bugs and Malfunctions

The surefire reports from eunit will no longer have names with embedded double quotes.

Own Id: OTP-14287

Eunit 2.3.2

Fixed Bugs and Malfunctions

The address to the FSF in the license header has been updated.

Own Id: OTP-14084

Eunit 2.3.1

Fixed Bugs and Malfunctions

When asserts were moved out to a separate header file, the automatic enabling of asserts when testing is enabled stopped working.

Own Id: OTP-13892

Eunit 2.3

Improvements and New Features

There is a new debugVal/2 that gives control over the truncation depth.

Own Id: OTP-13612

Eunit 2.2.13

Improvements and New Features

Suppress Dialyzer warnings.

Own Id: OTP-12862

Eunit 2.2.12

Fixed Bugs and Malfunctions

Small documentation fixes

Own Id: OTP-13017

Eunit 2.2.11

Fixed Bugs and Malfunctions

Improve success message when 2 tests have passed

Own Id: OTP-12952

Eunit 2.2.10

Fixed Bugs and Malfunctions

The eunit application is now unicode safe.

Own Id: OTP-11660

Eunit 2.2.9

Fixed Bugs and Malfunctions

Make sure to install .hrl files when needed

Own Id: OTP-12197

Make sure the clean rule for ssh, ssl, eunit and otp_mibs actually removes generated files.

Own Id: OTP-12200

Eunit 2.2.8

Fixed Bugs and Malfunctions

Minor refactoring.

Own Id: OTP-12051

Eunit 2.2.7

Fixed Bugs and Malfunctions

Application upgrade (appup) files are corrected for the following applications:

asn1, common_test, compiler, crypto, debugger, dialyzer, edoc, eldap, erl_docgen, et, eunit, gs, hipe, inets, observer, odbc, os_mon, otp_mibs, parsetools, percept, public_key, reltool, runtime_tools, ssh, syntax_tools, test_server, tools, typer, webtool, wx, xmerl

A new test utility for testing appup files is added to test_server. This is now used by most applications in OTP.

(Thanks to Tobias Schlager)

Own Id: OTP-11744

Eunit 2.2.6

Fixed Bugs and Malfunctions

Fix I/O-protocol error handling in eunit. Thanks to Yuki Ito.

Own Id: OTP-11373

Do not attempt to detect lists of printable characters in format. Thanks to Roberto Aloi.

Own Id: OTP-11467

Fix silent make rule (Thanks to Anthony Ramine )

Own Id: OTP-11516

Eunit 2.2.5

Improvements and New Features

Wrap eunit macros into begin ... end blocks. Thanks to Anthony Ramine.

Own Id: OTP-11217

Eunit 2.2.4

Improvements and New Features

Where necessary a comment stating encoding has been added to Erlang files. The comment is meant to be removed in Erlang/OTP R17B when UTF-8 becomes the default encoding.

Own Id: OTP-10630

Eunit 2.2.3

Fixed Bugs and Malfunctions

New option 'no_tty' to silent the default tty report.

Recognize the new stacktrace format introduced in R15, adding location information. (Thanks to Klas Johansson.)

Improve layout of error messages, printing the stack trace before the error term.

Heuristically detect and report bad return values from generators and instantiators. E.g., "ok" will not be interpreted as a module name, and a warning will be printed.

New test representation {test,M,F} for completeness along with {generator,M,F}. Tuples {M,F} are deprecated.

Use UTF-8 as encoding in Surefire output files. (Thanks to Lukas Larsson.)

Own Id: OTP-10173

Eunit 2.2.2

Improvements and New Features

Erlang/OTP can now be built using parallel make if you limit the number of jobs, for instance using 'make -j6' or 'make -j10'. 'make -j' does not work at the moment because of some missing dependencies.

Own Id: OTP-9451

Eunit 2.2.1

Fixed Bugs and Malfunctions

Generate separate surefire XMLs for each test suite

Previously the test cases of all test suites (=modules) were put in one and the same surefire report XML thereby breaking the principle of least astonishment and making post analysis harder. Assume the following layout:

src/x.erl src/y.erl test/x_tests.erl test/y_tests.erl

The results for both x_tests and y_tests were written to only one report grouped under either module x or y (seemingly randomly).

Now two reports, one for module x and one for y are generated. (Thanks to Klas Johansson)

Own Id: OTP-9465

Updated to EUnit version 2.2.0

New macros assertNotMatch(Guard, Expr), assertNotEqual(Unexpected, Expr), and assertNotException(Class, Term, Expr).

The debugMsg macro now also prints the pid of the current process.

When testing all modules in a directory, tests in Module_tests.erl are no longer executed twice.

The use of regexp internally has been replaced with re. (Thanks to Richard Carlsson)

Own Id: OTP-9505

Removed some never-matching clauses reported by dialyzer Updated author e-mails and homepages Removed cvs keywords from files Removed files that should not be checked in (Thanks to Richard Carlsson)

Own Id: OTP-9591

Eunit 2.1.7

Fixed Bugs and Malfunctions

Increase depth of error messages in Eunit Surefire reports

Currently, error messages in Eunit Surefire reports are shortened just like when written to a terminal. However, the space limitations that constrain terminal output do not apply here, so it's more useful to include more of the error message. The new depth of 100 should be enough for most cases, while protecting against runaway errors. (Thanks to Magnus Henoch)

Own Id: OTP-9220

Don't let eunit_surefire report back to eunit when stopping

When eunit is terminating, a stop message is sent to all listeners and eunit then waits for one result message but previously both eunit_tty and eunit_surefire sent a response on error. Don't send a result message from eunit_surefire; let eunit_tty take care of all result reporting, both positive and negative to avoid race conditions and inconsistencies. (Thanks to Klas Johansson)

Own Id: OTP-9269

Eunit 2.1.6

Fixed Bugs and Malfunctions

Fix format_man_pages so it handles all man sections and remove warnings/errors in various man pages.

Own Id: OTP-8600

Eunit 2.1.5

Improvements and New Features

The documentation is now possible to build in an open source environment after a number of bugs are fixed and some features are added in the documentation build process.

- The arity calculation is updated.

- The module prefix used in the function names for bif's are removed in the generated links so the links will look like "http://www.erlang.org/doc/man/erlang.html#append_element-2" instead of "http://www.erlang.org/doc/man/erlang.html#erlang:append_element-2".

- Enhanced the menu positioning in the html documentation when a new page is loaded.

- A number of corrections in the generation of man pages (thanks to Sergei Golovan)

- The legal notice is taken from the xml book file so OTP's build process can be used for non OTP applications.

Own Id: OTP-8343

Eunit 2.1.4

Improvements and New Features

The documentation is now built with open source tools (xsltproc and fop) that exists on most platforms. One visible change is that the frames are removed.

Own Id: OTP-8201

Eunit 2.1.3

Improvements and New Features

Miscellaneous updates.

Own Id: OTP-8190

Eunit 2.1.2

Improvements and New Features

Miscellaneous updates.

Own Id: OTP-8038

Eunit 2.1.1

Fixed Bugs and Malfunctions

eunit was broken in R13B.

Own Id: OTP-8018

Eunit 2.1

Improvements and New Features

Mostly internal changes, in particular to the event protocol; fixes problems with timeouts that could cause eunit to hang, and makes it much easier to write new reporting back-ends.

New "surefire" report backend for Maven and Bamboo.

The test representation is no longer traversed twice (the first pass was for enumeration only). This eliminates some strange restrictions on how generators can be written, but it also means that reports cannot be quite as complete as before in the event of skipped tests.

Own Id: OTP-7964

EUnit 2.0.1

Improvements and New Features

Corrected the documentation build.

EUnit 2.0

Improvements and New Features

This is the first version of EUnit (for unit testing of Erlang modules) by Richard Carlsson released in OTP.

EUnit - a Lightweight Unit Testing Framework for Erlang

EUnit is a unit testing framework for Erlang. It is very powerful and flexible, is easy to use, and has small syntactical overhead.

Unit testing

Terminology

Getting started

EUnit macros

EUnit test representation

EUnit builds on ideas from the family of unit testing frameworks for Object Oriented languages that originated with JUnit by Beck and Gamma (and Beck's previous framework SUnit for Smalltalk). However, EUnit uses techniques more adapted to functional and concurrent programming, and is typically less verbose than its relatives.

Although EUnit uses many preprocessor macros, they have been designed to be as nonintrusive as possible, and should not cause conflicts with existing code. Adding EUnit tests to a module should thus not normally require changing existing code. Furthermore, tests that only exercise the exported functions of a module can always be placed in a completely separate module, avoiding any conflicts entirely.

Unit testing

Unit Testing is testing of individual program "units" in relative isolation. There is no particular size requirement: a unit can be a function, a module, a process, or even a whole application, but the most typical testing units are individual functions or modules. In order to test a unit, you specify a set of individual tests, set up the smallest necessary environment for being able to run those tests (often, you don't need to do any setup at all), you run the tests and collect the results, and finally you do any necessary cleanup so that the test can be run again later. A Unit Testing Framework tries to help you in each stage of this process, so that it is easy to write tests, easy to run them, and easy to see which tests failed (so you can fix the bugs).

Advantages of unit testing

Reduces the risks of changing the program - Most programs will be modified during their lifetime: bugs will be fixed, features will be added, optimizations may become necessary, or the code will need to be refactored or cleaned up in other ways to make it easier to work with. But every change to a working program is a risk of introducing new bugs - or reintroducing bugs that had previously been fixed. Having a set of unit tests that you can run with very little effort makes it easy to know that the code still works as it should (this use is called regression testing; see Terminology). This goes a long way to reduce the resistance to changing and refactoring code.

Helps guide and speed up the development process - By focusing on getting the code to pass the tests, the programmer can become more productive, not overspecify or get lost in premature optimizations, and create code that is correct from the very beginning (so-called test-driven development; see Terminology).

Helps separate interface from implementation - When writing tests, the programmer may discover dependencies (in order to get the tests to run) that ought not to be there, and which need to be abstracted away to get a cleaner design. This helps eliminate bad dependencies before they spread throughout the code.

Makes component integration easier - By testing in a bottom-up fashion, beginning with the smallest program units and creating a confidence in that they work as they should, it becomes easier to test that a higher-level component, consisting of several such units, also behaves according to specification (known as integration testing; see Terminology).

Is self-documenting - The tests can be read as documentation, typically showing both examples of correct and incorrect usage, along with the expected consequences.

Terminology

Unit testing - Testing that a program unit behaves as it is supposed to do (in itself), according to its specifications. Unit tests have an important function as regression tests, when the program later is modified for some reason, since they check that the program still behaves according to specification.

Regression testing - Running a set of tests after making changes to a program, to check that the program behaves as it did before the changes (except, of course, for any intentional changes in behaviour). Unit tests are important as regression tests, but regression testing can involve more than just unit testing, and may also test behaviour that might not be part of the normal specification (such as bug-for-bug-compatibility).

Integration testing - Testing that a number of individually developed program units (assumed to already have been separately unit tested) work together as expected. Depending on the system being developed, integration testing may be as simple as "just another level of unit testing", but might also involve other kinds of tests (compare system testing).

System testing - Testing that a complete system behaves according to its specification. Specifically, system testing should not require knowing any details about the implementation. It typically involves testing many different aspects of the system behaviour apart from the basic functionality, such as performance, usability, and reliability.

Test-driven development - A program development technique where you continuously write tests before you implement the code that is supposed to pass those tests. This can help you focus on solving the right problems, and not make a more complicated implementation than necessary, by letting the unit tests determine when a program is "done": if it fulfils its specifications, there is no need to keep adding functionality.

Mock object - Sometimes, testing some unit A (e.g., a function) requires that it collaborates somehow with some other unit B (perhaps being passed as an argument, or by reference) - but B has not been implemented yet. A "mock object" - an object which, for the purposes of testing A, looks and behaves like a real B - might then be used instead. (This is of course only useful if it would be significantly more work to implement a real B than to create a mock object.)

Test case - A single, well-defined test, that somehow can be uniquely identified. When executed, the test case either passes or fails; the test report should identify exactly which test cases failed.

Test suite - A collection of test cases, generally with a specific, common target for testing, such as a single function, module, or subsystem. A test suite may also be recursively composed by smaller test suites.

Getting started

Including the EUnit header file

Writing simple test functions

Running EUnit

Writing test generating functions

An example

Disabling testing

Avoiding compile-time dependency on EUnit

Including the EUnit header file

The simplest way to use EUnit in an Erlang module is to add the following line at the beginning of the module (after the -module declaration, but before any function definitions):

   -include_lib("eunit/include/eunit.hrl").

This will have the following effect:

Creates an exported function test() (unless testing is turned off, and the module does not already contain a test() function), that can be used to run all the unit tests defined in the module

Causes all functions whose names match ..._test() or ..._test_() to be automatically exported from the module (unless testing is turned off, or the EUNIT_NOAUTO macro is defined)

Makes all the preprocessor macros of EUnit available, to help writing tests

Note: For -include_lib(...) to work, the Erlang module search path must contain a directory whose name ends in eunit/ebin (pointing to the ebin subdirectory of the EUnit installation directory). If EUnit is installed as lib/eunit under your Erlang/OTP system directory, its ebin subdirectory will be automatically added to the search path when Erlang starts. Otherwise, you need to add the directory explicitly, by passing a -pa flag to the erl or erlc command. For example, a Makefile could contain the following action for compiling .erl files:

   erlc -pa "path/to/eunit/ebin" $(ERL_COMPILE_FLAGS) -o$(EBIN) $<

or if you want Eunit to always be available when you run Erlang interactively, you can add a line like the following to your $HOME/.erlang file:

   code:add_path("/path/to/eunit/ebin").

Writing simple test functions

The EUnit framework makes it extremely easy to write unit tests in Erlang. There are a few different ways of writing them, though, so we start with the simplest:

A function with a name ending in ..._test() is recognized by EUnit as a simple test function - it takes no arguments, and its execution either succeeds (returning some arbitrary value that EUnit will throw away), or fails by throwing an exception of some kind (or by not terminating, in which case it will be aborted after a while).

An example of a simple test function could be the following:

   reverse_test() -> lists:reverse([1,2,3]).

This just tests that the function lists:reverse(List) does not crash when List is [1,2,3]. It is not a great test, but many people write simple functions like this one to test the basic functionality of their code, and those tests can be used directly by EUnit, without changes, as long as their function names match.

Use exceptions to signal failure To write more interesting tests, we need to make them crash (throw an exception) when they don't get the result they expect. A simple way of doing this is to use pattern matching with =, as in the following examples:

   reverse_nil_test() -> [] = lists:reverse([]).
   reverse_one_test() -> [1] = lists:reverse([1]).
   reverse_two_test() -> [2,1] = lists:reverse([1,2]).

If there was some bug in lists:reverse/1 that made it return something other than [2,1] when it got [1,2] as input, then the last test above would throw a badmatch error. The first two (we assume they do not get a badmatch) would simply return [] and [1], respectively, so both succeed. (Note that EUnit is not psychic: if you write a test that returns a value, even if it is the wrong value, EUnit will consider it a success. You must make sure that the test is written so that it causes a crash if the result is not what it should be.)

Using assert macros If you want to use Boolean operators for your tests, the assert macro comes in handy (see EUnit macros for details):

   length_test() -> ?assert(length([1,2,3]) =:= 3).

The ?assert(Expression) macro will evaluate Expression, and if that does not evaluate to true, it will throw an exception; otherwise it just returns ok. In the above example, the test will thus fail if the call to length does not return 3.

Running EUnit

If you have added the declaration -include_lib("eunit/include/eunit.hrl") to your module, as described above, you only need to compile the module, and run the automatically exported function test(). For example, if your module was named m, then calling \m:test() will run EUnit on all the tests defined in the module. You do not need to write -export declarations for the test functions. This is all done by magic.

You can also use the function eunit:test/1 to run arbitrary tests, for example to try out some more advanced test descriptors (see EUnit test representation). For example, running eunit:test(m) does the same thing as the auto-generated function \m:test(), while eunit:test({inparallel, m}) runs the same test cases but executes them all in parallel.

Putting tests in separate modules

If you want to separate your test code from your normal code (at least for testing the exported functions), you can simply write the test functions in a module named m_tests (note: not m_test), if your module is named m. Then, whenever you ask EUnit to test the module m, it will also look for the module m_tests and run those tests as well. See ModuleName in the section Primitives for details.

EUnit captures standard output

If your test code writes to the standard output, you may be surprised to see that the text does not appear on the console when the tests are running. This is because EUnit captures all standard output from test functions (this also includes setup and cleanup functions, but not generator functions), so that it can be included in the test report if errors occur. To bypass EUnit and print text directly to the console while testing, you can write to the user output stream, as in io:format(user, "~w", [Term]). The recommended way of doing this is to use the EUnit Debugging macros, which make it much simpler.

For checking the output produced by the unit under test, see Macros for checking output.

Writing test generating functions

A drawback of simple test functions is that you must write a separate function (with a separate name) for each test case. A more compact way of writing tests (and much more flexible, as we shall see), is to write functions that return tests, instead of being tests.

A function with a name ending in ..._test_() (note the final underscore) is recognized by EUnit as a test generator function. Test generators return a representation of a set of tests to be executed by EUnit.

Representing a test as data The most basic representation of a test is a single fun-expression that takes no arguments. For example, the following test generator:

   basic_test_() ->
       fun () -> ?assert(1 + 1 =:= 2) end.

will have the same effect as the following simple test:

   simple_test() ->
       ?assert(1 + 1 =:= 2).

(in fact, EUnit will handle all simple tests just like it handles fun-expressions: it will put them in a list, and run them one by one).

Using macros to write tests To make tests more compact and readable, as well as automatically add information about the line number in the source code where a test occurred (and reduce the number of characters you have to type), you can use the _test macro (note the initial underscore character), like this:

   basic_test_() ->
       ?_test(?assert(1 + 1 =:= 2)).

The _test macro takes any expression (the "body") as argument, and places it within a fun-expression (along with some extra information). The body can be any kind of test expression, just like the body of a simple test function.

Underscore-prefixed macros create test objects But this example can be made even shorter! Most test macros, such as the family of assert macros, have a corresponding form with an initial underscore character, which automatically adds a ?_test(...) wrapper. The above example can then simply be written:

   basic_test_() ->
       ?_assert(1 + 1 =:= 2).

which has exactly the same meaning (note the _assert instead of assert). You can think of the initial underscore as signalling test object.

An example

Sometimes, an example says more than a thousand words. The following small Erlang module shows how EUnit can be used in practice.

   -module(fib).
   -export([fib/1]).
   -include_lib("eunit/include/eunit.hrl").

   fib(0) -> 1;
   fib(1) -> 1;
   fib(N) when N > 1 -> fib(N-1) + fib(N-2).

   fib_test_() ->
       [?_assert(fib(0) =:= 1),
	?_assert(fib(1) =:= 1),
	?_assert(fib(2) =:= 2),
	?_assert(fib(3) =:= 3),
	?_assert(fib(4) =:= 5),
	?_assert(fib(5) =:= 8),
	?_assertException(error, function_clause, fib(-1)),
	?_assert(fib(31) =:= 2178309)
       ].

(Author's note: When I first wrote this example, I happened to write a * instead of + in the fib function. Of course, this showed up immediately when I ran the tests.)

See EUnit test representation for a full list of all the ways you can specify test sets in EUnit.

Disabling testing

Testing can be turned off by defining the NOTEST macro when compiling, for example as an option to erlc, as in:

   erlc -DNOTEST my_module.erl

or by adding a macro definition to the code, before the EUnit header file is included:

   -define(NOTEST, 1).

(the value is not important, but should typically be 1 or true). Note that unless the EUNIT_NOAUTO macro is defined, disabling testing will also automatically strip all test functions from the code, except for any that are explicitly declared as exported.

For instance, to use EUnit in your application, but with testing turned off by default, put the following lines in a header file:

   -define(NOTEST, true).
   -include_lib("eunit/include/eunit.hrl").

and then make sure that every module of your application includes that header file. This means that you have a single place to modify in order to change the default setting for testing. To override the NOTEST setting without modifying the code, you can define TEST in a compiler option, like this:

   erlc -DTEST my_module.erl

See Compilation control macros for details about these macros.

Avoiding compile-time dependency on EUnit

If you are distributing the source code for your application for other people to compile and run, you probably want to ensure that the code compiles even if EUnit is not available. Like the example in the previous section, you can put the following lines in a common header file:

   -ifdef(TEST).
   -include_lib("eunit/include/eunit.hrl").
   -endif.

and, of course, also make sure that you place all test code that uses EUnit macros within -ifdef(TEST) or -ifdef(EUNIT) sections.

EUnit macros

Although all the functionality of EUnit is available even without the use of preprocessor macros, the EUnit header file defines a number of such macros in order to make it as easy as possible to write unit tests as compactly as possible and without getting too many details in the way.

Except where explicitly stated, using EUnit macros will never introduce run-time dependencies on the EUnit library code, regardless of whether your code is compiled with testing enabled or disabled.

Basic macros

Compilation control macros

Utility macros

Assert macros

Macros for checking output

Macros for running external commands

Macros for instrumentation

Debugging macros

Basic macros

_test(Expr) - Turns Expr into a "test object", by wrapping it in a fun-expression and a source line number. Technically, this is the same as {?LINE, fun () -> (Expr) end}.

Compilation control macros

EUNIT - This macro is always defined to true whenever EUnit is enabled at compile time. This is typically used to place testing code within conditional compilation, as in:

   -ifdef(EUNIT).
       % test code here
       ...
   -endif.

e.g., to ensure that the code can be compiled without including the EUnit header file, when testing is disabled. See also the macros TEST and NOTEST.

EUNIT_NOAUTO - If this macro is defined, the automatic exporting or stripping of test functions will be disabled.

TEST - This macro is always defined (to true, unless previously defined by the user to have another value) whenever EUnit is enabled at compile time. This can be used to place testing code within conditional compilation; see also the macros NOTEST and EUNIT.

For testing code that is strictly dependent on EUnit, it may be preferable to use the EUNIT macro for this purpose, while for code that uses more generic testing conventions, using the TEST macro may be preferred.

The TEST macro can also be used to override the NOTEST macro. If TEST is defined before the EUnit header file is included (even if NOTEST is also defined), then the code will be compiled with EUnit enabled.

NOTEST - This macro is always defined (to true, unless previously defined by the user to have another value) whenever EUnit is disabled at compile time. (Compare the TEST macro.)

This macro can also be used for conditional compilation, but is more typically used to disable testing: If NOTEST is defined before the EUnit header file is included, and TEST is not defined, then the code will be compiled with EUnit disabled. See also Disabling testing.

NOASSERT - If this macro is defined, the assert macros will have no effect, when testing is also disabled. See Assert macros. When testing is enabled, the assert macros are always enabled automatically and cannot be disabled.

ASSERT - If this macro is defined, it overrides the NOASSERT macro, forcing the assert macros to always be enabled regardless of other settings.

NODEBUG - If this macro is defined, the debugging macros will have no effect. See Debugging macros. NODEBUG also implies NOASSERT, unless testing is enabled.

DEBUG - If this macro is defined, it overrides the NODEBUG macro, forcing the debugging macros to be enabled.

Utility macros

The following macros can make tests more compact and readable:

LET(Var,Arg,Expr) - Creates a local binding Var = Arg in Expr. (This is the same as (fun(Var)->(Expr)end)(Arg).) Note that the binding is not exported outside of Expr, and that within Expr, this binding of Var will shadow any binding of Var in the surrounding scope.

IF(Cond,TrueCase,FalseCase) - Evaluates TrueCase if Cond evaluates to true, or otherwise evaluates FalseCase if Cond evaluates to false. (This is the same as (case (Cond) of true->(TrueCase); false->(FalseCase) end).) Note that it is an error if Cond does not yield a boolean value.

Assert macros

(Note that these macros also have corresponding forms which start with an "_" (underscore) character, as in ?_assert(BoolExpr), that create a "test object" instead of performing the test immediately. This is equivalent to writing ?_test(assert(BoolExpr)), etc.)

If the macro NOASSERT is defined before the EUnit header file is included, these macros have no effect when testing is also disabled; see Compilation control macros for details.

assert(BoolExpr) - Evaluates the expression BoolExpr, if testing is enabled. Unless the result is true, an informative exception will be generated. If there is no exception, the result of the macro expression is the atom ok, and the value of BoolExpr is discarded. If testing is disabled, the macro will not generate any code except the atom ok, and BoolExpr will not be evaluated.

Typical usage:

   ?assert(f(X, Y) =:= [])

The assert macro can be used anywhere in a program, not just in unit tests, to check pre/postconditions and invariants. For example:

   some_recursive_function(X, Y, Z) ->
       ?assert(X + Y > Z),
       ...

assertNot(BoolExpr) - Equivalent to assert(not (BoolExpr)).

assertMatch(GuardedPattern, Expr) - Evaluates Expr and matches the result against GuardedPattern, if testing is enabled. If the match fails, an informative exception will be generated; see the assert macro for further details. GuardedPattern can be anything that you can write on the left hand side of the -> symbol in a case-clause, except that it cannot contain comma-separated guard tests.

The main reason for using assertMatch also for simple matches, instead of matching with =, is that it produces more detailed error messages.

Examples:

   ?assertMatch({found, {fred, _}}, lookup(bloggs, Table))

   ?assertMatch([X|_] when X > 0, binary_to_list(B))

assertNotMatch(GuardedPattern, Expr) - The inverse case of assertMatch, for convenience.

assertEqual(Expect, Expr) - Evaluates the expressions Expect and Expr and compares the results for equality, if testing is enabled. If the values are not equal, an informative exception will be generated; see the assert macro for further details.

assertEqual is more suitable than assertMatch when the left-hand side is a computed value rather than a simple pattern, and gives more details than ?assert(Expect =:= Expr).

Examples:

   ?assertEqual("b" ++ "a", lists:reverse("ab"))

   ?assertEqual(foo(X), bar(Y))

assertNotEqual(Unexpected, Expr) - The inverse case of assertEqual, for convenience.

assertException(ClassPattern, TermPattern, Expr)

assertError(TermPattern, Expr)

assertExit(TermPattern, Expr)

assertThrow(TermPattern, Expr) - Evaluates Expr, catching any exception and testing that it matches the expected ClassPattern:TermPattern. If the match fails, or if no exception is thrown by Expr, an informative exception will be generated; see the assert macro for further details. The assertError, assertExit, and assertThrow macros, are equivalent to using assertException with a ClassPattern of error, exit, or throw, respectively.

Examples:

   ?assertError(badarith, X/0)

   ?assertExit(normal, exit(normal))

   ?assertException(throw, {not_found,_}, throw({not_found,42}))

Macros for checking output

The following macro can be used within a test case to retrieve the output written to standard output.

capturedOutput - The output captured by EUnit in the current test case, as a string.

Examples:

   io:format("Hello~n"),
   ?assertEqual("Hello\n", ?capturedOutput)

Macros for running external commands

Keep in mind that external commands are highly dependent on the operating system. You can use the standard library function os:type() in test generator functions, to produce different sets of tests depending on the current operating system.

Note: these macros introduce a run-time dependency on the EUnit library code, if compiled with testing enabled.

assertCmd(CommandString) - Runs CommandString as an external command, if testing is enabled. Unless the returned status value is 0, an informative exception will be generated. If there is no exception, the result of the macro expression is the atom ok. If testing is disabled, the macro will not generate any code except the atom ok, and the command will not be executed.

Typical usage:

   ?assertCmd("mkdir foo")

assertCmdStatus(N, CommandString) - Like the assertCmd(CommandString) macro, but generates an exception unless the returned status value is N.

assertCmdOutput(Text, CommandString) - Runs CommandString as an external command, if testing is enabled. Unless the output produced by the command exactly matches the specified string Text, an informative exception will be generated. (Note that the output is normalized to use a single LF character as line break on all platforms.) If there is no exception, the result of the macro expression is the atom ok. If testing is disabled, the macro will not generate any code except the atom ok, and the command will not be executed.

cmd(CommandString) - Runs CommandString as an external command. Unless the returned status value is 0 (indicating success), an informative exception will be generated; otherwise, the result of the macro expression is the output produced by the command, as a flat string. The output is normalized to use a single LF character as line break on all platforms.

This macro is useful in the setup and cleanup sections of fixtures, e.g., for creating and deleting files or perform similar operating system specific tasks, to make sure that the test system is informed of any failures.

A Unix-specific example:

   {setup,
    fun () -> ?cmd("mktemp") end,
    fun (FileName) -> ?cmd("rm " ++ FileName) end,
    ...}

Macros for instrumentation

To help with instrumenting, EUnit defines a macro that can introduce delays into the runtime. This can help uncover subtle timing bugs that may not be evident when timing is perfect.

If the macro NODEBUG is defined before the EUnit header file is included, these macros have no effect; see Compilation control macros for details.

randomDelay(Probability, Min, Max) - This macro is used to cause non-deterministic latency into execution, which is useful for uncovering race conditions and timing-dependent bugs during testing.

Debugging macros

To help with debugging, EUnit defines several useful macros for printing messages directly to the console (rather than to the standard output). Furthermore, these macros all use the same basic format, which includes the file and line number where they occur, making it possible in some development environments (e.g., when running Erlang in an Emacs buffer) to simply click on the message and jump directly to the corresponding line in the code.

If the macro NODEBUG is defined before the EUnit header file is included, these macros have no effect; see Compilation control macros for details.

debugHere - Just prints a marker showing the current file and line number. Note that this is an argument-less macro. The result is always ok.

debugMsg(Text) - Outputs the message Text (which can be a plain string, an IO-list, or just an atom). The result is always ok.

debugFmt(FmtString, Args) - This formats the text like io:format(FmtString, Args) and outputs it like debugMsg. The result is always ok.

debugVal(Expr) - Prints both the source code for Expr and its current value. E.g., ?debugVal(f(X)) might be displayed as "f(X) = 42". (Large terms are truncated to the depth given by the macro EUNIT_DEBUG_VAL_DEPTH, which defaults to 15 but can be overridden by the user.) The result is always the value of Expr, so this macro can be wrapped around any expression to display its value when the code is compiled with debugging enabled.

debugVal(Expr, Depth) - Like debugVal(Expr), but prints terms truncated to the given depth.

debugTime(Text,Expr) - Prints Text and the wall clock time for evaluation of Expr. The result is always the value of Expr, so this macro can be wrapped around any expression to show its run time when the code is compiled with debugging enabled. For example, List1 = ?debugTime("sorting", lists:sort(List)) might show as "sorting: 0.015 s".

EUnit test representation

The way EUnit represents tests and test sets as data is flexible, powerful, and concise. This section describes the representation in detail.

Simple test objects

Test sets and deep lists

Titles

Primitives

Control

Fixtures

Lazy generators

Simple test objects

A simple test object is one of the following:

A nullary functional value (i.e., a fun that takes zero arguments). Examples:

   fun () -> ... end

   fun some_function/0

   fun some_module:some_function/0

A tuple {test, ModuleName, FunctionName}, where ModuleName and FunctionName are atoms, referring to the function ModuleName:FunctionName/0

(Obsolete) A pair of atoms {ModuleName, FunctionName}, equivalent to {test, ModuleName, FunctionName} if nothing else matches first. This might be removed in a future version.

A pair {LineNumber, SimpleTest}, where LineNumber is a nonnegative integer and SimpleTest is another simple test object. LineNumber should indicate the source line of the test. Pairs like this are usually only created via ?_test(...) macros; see Basic macros.

In brief, a simple test object consists of a single function that takes no arguments (possibly annotated with some additional metadata, i.e., a line number). Evaluation of the function either succeeds, by returning some value (which is ignored), or fails, by throwing an exception.

Test sets and deep lists

A test set can be easily created by placing a sequence of test objects in a list. If T_1, ..., T_N are individual test objects, then [T_1, ..., T_N] is a test set consisting of those objects (in that order).

Test sets can be joined in the same way: if S_1, ..., S_K are test sets, then [S_1, ..., S_K] is also a test set, where the tests of S_i are ordered before those of S_(i+1), for each subset S_i.

Thus, the main representation of test sets is deep lists, and a simple test object can be viewed as a test set containing only a single test; there is no difference between T and [T].

A module can also be used to represent a test set; see ModuleName under Primitives below.

Titles

Any test or test set T can be annotated with a title, by wrapping it in a pair {Title, T}, where Title is a string. For convenience, any test which is normally represented using a tuple can simply be given a title string as the first element, i.e., writing {"The Title", ...} instead of adding an extra tuple wrapper as in {"The Title", {...}}.

Primitives

The following are primitives, which do not contain other test sets as arguments:

ModuleName::atom() - A single atom represents a module name, and is equivalent to {module, ModuleName}. This is often used as in the call eunit:test(some_module).

{module, ModuleName::atom()} - This composes a test set from the exported test functions of the named module, i.e., those functions with arity zero whose names end with _test or _test_. Basically, the ..._test() functions become simple tests, while the ..._test_() functions become generators.

In addition, EUnit will also look for another module whose name is ModuleName plus the suffix _tests, and if it exists, all the tests from that module will also be added. (If ModuleName already contains the suffix _tests, this is not done.) E.g., the specification {module, mymodule} will run all tests in the modules mymodule and mymodule_tests. Typically, the _tests module should only contain test cases that use the public interface of the main module (and no other code).

{application, AppName::atom(), Info::list()} - This is a normal Erlang/OTP application descriptor, as found in an .app file. The resulting test set consists of the modules listed in the modules entry in Info.

{application, AppName::atom()} - This creates a test set from all the modules belonging to the specified application, by consulting the application's .app file (see {file, FileName}), or if no such file exists, by testing all object files in the application's ebin-directory (see {dir, Path}); if that does not exist, the code:lib_dir(AppName) directory is used.

Path::string() - A single string represents the path of a file or directory, and is equivalent to {file, Path}, or {dir, Path}, respectively, depending on what Path refers to in the file system.

{file, FileName::string()} - If FileName has a suffix that indicates an object file (.beam), EUnit will try to reload the module from the specified file and test it. Otherwise, the file is assumed to be a text file containing test specifications, which will be read using the standard library function file:path_consult/2.

Unless the file name is absolute, the file is first searched for relative to the current directory, and then using the normal search path (code:get_path()). This means that the names of typical "app" files can be used directly, without a path, e.g., "mnesia.app".

{dir, Path::string()} - This tests all object files in the specified directory, as if they had been individually specified using {file, FileName}.

{generator, GenFun::(() -> Tests)} - The generator function GenFun is called to produce a test set.

{generator, ModuleName::atom(), FunctionName::atom()} - The function ModuleName:FunctionName() is called to produce a test set.

{with, X::any(), [AbstractTestFun::((any()) -> any())]} - Distributes the value X over the unary functions in the list, turning them into nullary test functions. An AbstractTestFun is like an ordinary test fun, but takes one argument instead of zero - it's basically missing some information before it can be a proper test. In practice, {with, X, [F_1, ..., F_N]} is equivalent to [fun () -> F_1(X) end, ..., fun () -> F_N(X) end]. This is particularly useful if your abstract test functions are already implemented as proper functions: {with, FD, [fun filetest_a/1, fun filetest_b/1, fun filetest_c/1]} is equivalent to [fun () -> filetest_a(FD) end, fun () -> filetest_b(FD) end, fun () -> filetest_c(FD) end], but much more compact. See also Fixtures, below.

Control

The following representations control how and where tests are executed:

{spawn, Tests} - Runs the specified tests in a separate subprocess, while the current test process waits for it to finish. This is useful for tests that need a fresh, isolated process state. (Note that EUnit always starts at least one such a subprocess automatically; tests are never executed by the caller's own process.)

{spawn, Node::atom(), Tests} - Like {spawn, Tests}, but runs the specified tests on the given Erlang node.

{timeout, Time::number(), Tests} - Runs the specified tests under the given timeout. Time is in seconds; e.g., 60 means one minute and 0.1 means 1/10th of a second. If the timeout is exceeded, the unfinished tests will be forced to terminate. Note that if a timeout is set around a fixture, it includes the time for setup and cleanup, and if the timeout is triggered, the entire fixture is abruptly terminated (without running the cleanup). The default timeout for an individual test is 5 seconds.

{inorder, Tests} - Runs the specified tests in strict order. Also see {inparallel, Tests}. By default, tests are neither marked as inorder or inparallel, but may be executed as the test framework chooses.

{inparallel, Tests} - Runs the specified tests in parallel (if possible). Also see {inorder, Tests}.

{inparallel, N::integer(), Tests} - Like {inparallel, Tests}, but running no more than N subtests simultaneously.

Fixtures

A "fixture" is some state that is necessary for a particular set of tests to run. EUnit's support for fixtures makes it easy to set up such state locally for a test set, and automatically tear it down again when the test set is finished, regardless of the outcome (success, failures, timeouts, etc.).

To make the descriptions simpler, we first list some definitions:

Setup | () -> (R::any())
SetupX | (X::any()) -> (R::any())
Cleanup | (R::any()) -> any()
CleanupX | (X::any(), R::any()) -> any()
Instantiator | ((R::any()) -> Tests) | {with, [AbstractTestFun::((any()) -> any())]}
Where | local | spawn | {spawn, Node::atom()}

(these are explained in more detail further below.)

The following representations specify fixture handling for test sets:

{setup, Setup, Tests | Instantiator}

{setup, Setup, Cleanup, Tests | Instantiator}

{setup, Where, Setup, Tests | Instantiator}

{setup, Where, Setup, Cleanup, Tests | Instantiator} - setup sets up a single fixture for running all of the specified tests, with optional teardown afterwards. The arguments are described in detail below.

{node, Node::atom(), Tests | Instantiator}

{node, Node::atom(), Args::[string()] | string(), Tests | Instantiator} - node is like setup, but with a built-in behaviour: it starts a peer node for the duration of the tests. The atom Node should have the format nodename@full.machine.name, and Args are the optional arguments to the new node; see peer:start_link/1 for details. To remain compatible with pre-existing user tests, Args accepts both a list of strings and a string. If a string is passed, it is parsed into a list of arguments, treating single- and double-quoted text as single arguments and removing the quotes. If you wish a quote character to remain a part of the parsed argument list, escape it with a backslash "\". Unbalanced quotes also become a part of the output.

{foreach, Where, Setup, Cleanup, [Tests | Instantiator]}

{foreach, Setup, Cleanup, [Tests | Instantiator]}

{foreach, Where, Setup, [Tests | Instantiator]}

{foreach, Setup, [Tests | Instantiator]} - foreach is used to set up a fixture and optionally tear it down afterwards, repeated for each single one of the specified test sets.

{foreachx, Where, SetupX, CleanupX, Pairs::[{X::any(), ((X::any(), R::any()) -> Tests)}]}

{foreachx, SetupX, CleanupX, Pairs}

{foreachx, Where, SetupX, Pairs}

{foreachx, SetupX, Pairs} - foreachx is like foreach, but uses a list of pairs, each containing an extra argument X and an extended instantiator function.

A Setup function is executed just before any of the specified tests are run, and a Cleanup function is executed when no more of the specified tests will be run, regardless of the reason. A Setup function takes no argument, and returns some value which will be passed as it is to the Cleanup function. A Cleanup function should do whatever necessary and return some arbitrary value, such as the atom ok. (SetupX and CleanupX functions are similar, but receive one additional argument: some value X, which depends on the context.) When no Cleanup function is specified, a dummy function is used which has no effect.

An Instantiator function receives the same value as the Cleanup function, i.e., the value returned by the Setup function. It should then behave much like a generator (see Primitives), and return a test set whose tests have been instantiated with the given value. A special case is the syntax {with, [AbstractTestFun]} which represents an instantiator function that distributes the value over a list of unary functions; see Primitives: {with, X, [...]} for more details.

A Where term controls how the specified tests are executed. The default is spawn, which means that the current process handles the setup and teardown, while the tests are executed in a subprocess. {spawn, Node} is like spawn, but runs the subprocess on the specified node. local means that the current process will handle both setup/teardown and running the tests - the drawback is that if a test times out so that the process is killed, the cleanup will not be performed; hence, avoid this for persistent fixtures such as file operations. In general, local should only be used when:

the setup/teardown needs to be executed by the process that will run the tests;

no further teardown needs to be done if the process is killed (i.e., no state outside the process was affected by the setup)

Lazy generators

Sometimes, it can be convenient not to produce the whole set of test descriptions before the testing begins; for example, if you want to generate a huge amount of tests that would take up too much space to keep in memory all at once.

It is fairly easy to write a generator which, each time it is called, either produces an empty list if it is done, or otherwise produces a list containing a single test case plus a new generator which will produce the rest of the tests. This demonstrates the basic pattern:

   lazy_test_() ->
       lazy_gen(10000).

   lazy_gen(N) ->
       {generator,
        fun () ->
            if N > 0 ->
                   [?_test(...)
                    | lazy_gen(N-1)];
               true ->
                   []
            end
        end}.

When EUnit traverses the test representation in order to run the tests, the new generator will not be called to produce the next test until the previous test has been executed.

Note that it is easiest to write this kind of recursive generator using a help function, like the lazy_gen/1 function above. It can also be written using a recursive fun, if you prefer to not clutter your function namespace and are comfortable with writing that kind of code.

eunit

This module is the main EUnit user interface.

Summary

Functions

start()

Starts the EUnit server. Normally, you don't need to call this function; it is started automatically.

stop()

Stops the EUnit server. Normally, you don't need to call this function.

test(Tests)

Equivalent to test(Tests, []).

test(Tests, Options)

Runs a set of tests. The format of Tests is described in the section EUnit test representation of the overview.

Functions

start()

-spec start() -> term().

Starts the EUnit server. Normally, you don't need to call this function; it is started automatically.

stop()

-spec stop() -> term().

Stops the EUnit server. Normally, you don't need to call this function.

test(Tests)

-spec test(Tests :: term()) -> ok | {error, term()} | error.

Equivalent to test(Tests, []).

test(Tests, Options)

-spec test(Tests :: term(), Options :: [term()]) -> ok | error | {error, term()}.

Runs a set of tests. The format of Tests is described in the section EUnit test representation of the overview.

Example:

  eunit:test(fred)

runs all tests in the module fred and also any tests in the module fred_tests, if that module exists.

Options:

verbose - Displays more details about the running tests.

print_depth - Maximum depth to which terms are printed in case of error.

exact_execution - If this boolean flag is set to true framework will not automatically execute tests found in related module suffixed with "_tests". This behaviour might be unwanted if execution of modules found in a folder is ordered while it contains both source and test modules.

scale_timeouts - If this numeric value is set, timeouts will get scaled accordingly. It may be useful when running a set of tests on a slower host. Examples: {scale_timeouts,10} make the timeouts 10 times longer, while {scale_timeouts,0.1} would shorten them by a factor of 10.

Options in the environment variable EUNIT are also included last in the option list, i.e., have lower precedence than those in Options.

See also: test/1.

eunit_surefire

Surefire reports for EUnit (Format used by Maven and Atlassian Bamboo for example to integrate test results). Based on initial code from Paul Guyot.

Example: Generate XML result file in the current directory:

     eunit:test([fib, eunit_examples],
                [{report,{eunit_surefire,[{dir,"."}]}}]).

See also: eunit.